INSERT INTO `crpm_bf21f2_bf9886` (`spbm`,`spmc`,`spfl`,`kcsl`,`aqkc`,`jhjg`,`xsjg`,`gys`,`zhjhrq`,`zhxsrq`,`yjjb`) VALUES ('SP20240501','42U服务器机柜','网络设备','35','20','1850','2580','深圳图腾通信','2024-05-10','2024-06-05','绿色');
INSERT INTO `crpm_bf21f2_bf9886` (`spbm`,`spmc`,`spfl`,`kcsl`,`aqkc`,`jhjg`,`xsjg`,`gys`,`zhjhrq`,`zhxsrq`,`yjjb`) VALUES ('SP20240502','24口千兆交换机','网络设备','28','15','1280','1860','杭州华三通信','2024-05-15','2024-06-10','绿色');
INSERT INTO `crpm_bf21f2_bf9886` (`spbm`,`spmc`,`spfl`,`kcsl`,`aqkc`,`jhjg`,`xsjg`,`gys`,`zhjhrq`,`zhxsrq`,`yjjb`) VALUES ('SP20240503','4TB企业级硬盘','存储设备','42','25','1250','1780','希捷科技','2024-05-20','2024-06-15','绿色');
INSERT INTO `crpm_bf21f2_bf9886` (`spbm`,`spmc`,`spfl`,`kcsl`,`aqkc`,`jhjg`,`xsjg`,`gys`,`zhjhrq`,`zhxsrq`,`yjjb`) VALUES ('SP20240504','16GB DDR4 ECC内存','存储设备','65','30','580','850','金士顿科技','2024-05-25','2024-06-20','绿色');
INSERT INTO `crpm_bf21f2_bf9886` (`spbm`,`spmc`,`spfl`,`kcsl`,`aqkc`,`jhjg`,`xsjg`,`gys`,`zhjhrq`,`zhxsrq`,`yjjb`) VALUES ('SP20240505','机架式服务器','IT设备','12','10','8600','12500','戴尔科技','2024-05-30','2024-06-25','黄色');
INSERT INTO `crpm_bf21f2_bf9886` (`spbm`,`spmc`,`spfl`,`kcsl`,`aqkc`,`jhjg`,`xsjg`,`gys`,`zhjhrq`,`zhxsrq`,`yjjb`) VALUES ('SP20240506','企业级防火墙','安全设备','8','5','15800','23800','深信服科技','2024-06-01','2024-06-28','绿色');
INSERT INTO `crpm_bf21f2_bf9886` (`spbm`,`spmc`,`spfl`,`kcsl`,`aqkc`,`jhjg`,`xsjg`,`gys`,`zhjhrq`,`zhxsrq`,`yjjb`) VALUES ('SP20240507','无线接入点','网络设备','55','35','780','1150','思科系统','2024-06-05','2024-06-29','绿色');
INSERT INTO `crpm_bf21f2_bf9886` (`spbm`,`spmc`,`spfl`,`kcsl`,`aqkc`,`jhjg`,`xsjg`,`gys`,`zhjhrq`,`zhxsrq`,`yjjb`) VALUES ('SP20240508','2U机架式UPS','电源设备','18','10','4200','6500','伊顿电力','2024-06-10','2024-06-22','绿色');
INSERT INTO `crpm_bf21f2_bf9886` (`spbm`,`spmc`,`spfl`,`kcsl`,`aqkc`,`jhjg`,`xsjg`,`gys`,`zhjhrq`,`zhxsrq`,`yjjb`) VALUES ('SP20240509','KVM切换器','网络设备','9','10','1560','2380','雷蛇电子','2024-06-15','2024-06-18','红色');
INSERT INTO `crpm_bf21f2_bf9886` (`spbm`,`spmc`,`spfl`,`kcsl`,`aqkc`,`jhjg`,`xsjg`,`gys`,`zhjhrq`,`zhxsrq`,`yjjb`) VALUES ('SP20240510','网络机柜PDU','电源设备','22','15','860','1280','施耐德电气','2024-06-20','2024-06-27','绿色');