CREATE TABLE `crpm_95e998_c582ce` (
`id` BIGINT NOT NULL AUTO_INCREMENT PRIMARY KEY,
`yfjcgz` varchar(255) DEFAULT NULL COMMENT '语法检查规则',
`djcdm` varchar(255) DEFAULT NULL COMMENT '待检查代码',
`jcjg` varchar(255) DEFAULT NULL COMMENT '检查结果'
);