INSERT INTO `crpm_13465a_9cdb2d` (`cpmc`,`scpch`,`jhkssj`,`jhjssj`,`sjkssj`,`sjjssj`,`scsl`,`scx`,`fzr`,`ddbh`,`wlxqlb`,`zt`) VALUES ('智能控制器','PC-202406001','2024-06-01 08:00:00','2024-06-05 17:00:00','2024-06-01 08:00:00','2024-06-05 16:30:00','1000','L1','王工','MO-202406001','电路板,外壳,传感器','已完成');
INSERT INTO `crpm_13465a_9cdb2d` (`cpmc`,`scpch`,`jhkssj`,`jhjssj`,`sjkssj`,`sjjssj`,`scsl`,`scx`,`fzr`,`ddbh`,`wlxqlb`,`zt`) VALUES ('工业传感器','PC-202406002','2024-06-03 09:30:00','2024-06-08 16:30:00','2024-06-04 09:30:00','2024-06-08 17:00:00','800','L2','李工','MO-202406002','感应芯片,线缆,外壳','已完成');
INSERT INTO `crpm_13465a_9cdb2d` (`cpmc`,`scpch`,`jhkssj`,`jhjssj`,`sjkssj`,`sjjssj`,`scsl`,`scx`,`fzr`,`ddbh`,`wlxqlb`,`zt`) VALUES ('精密齿轮箱','PC-202406003','2024-06-05 08:30:00','2024-06-12 17:30:00','2024-06-05 08:30:00','2024-06-12 16:00:00','500','L3','张工','MO-202406003','齿轮毛坯,轴承,润滑油','已完成');
INSERT INTO `crpm_13465a_9cdb2d` (`cpmc`,`scpch`,`jhkssj`,`jhjssj`,`sjkssj`,`sjjssj`,`scsl`,`scx`,`fzr`,`ddbh`,`wlxqlb`,`zt`) VALUES ('锂电池组','PC-202406004','2024-06-08 10:00:00','2024-06-15 16:00:00','2024-06-08 10:00:00','2024-06-15 17:30:00','1200','L4','赵工','MO-202406004','电芯,电解液,保护板','已完成');
INSERT INTO `crpm_13465a_9cdb2d` (`cpmc`,`scpch`,`jhkssj`,`jhjssj`,`sjkssj`,`sjjssj`,`scsl`,`scx`,`fzr`,`ddbh`,`wlxqlb`,`zt`) VALUES ('伺服电机','PC-202406005','2024-06-10 08:00:00','2024-06-16 17:00:00','2024-06-10 08:00:00','2024-06-16 17:00:00','600','L1','王工','MO-202406005','定子,转子,编码器','已完成');
INSERT INTO `crpm_13465a_9cdb2d` (`cpmc`,`scpch`,`jhkssj`,`jhjssj`,`sjkssj`,`sjjssj`,`scsl`,`scx`,`fzr`,`ddbh`,`wlxqlb`,`zt`) VALUES ('PLC控制器','PC-202407006','2024-07-01 09:00:00','2024-07-07 16:00:00','2024-07-01 09:00:00','2024-07-07 17:30:00','900','L2','李工','MO-202407006','主控芯片,电容,外壳','已完成');
INSERT INTO `crpm_13465a_9cdb2d` (`cpmc`,`scpch`,`jhkssj`,`jhjssj`,`sjkssj`,`sjjssj`,`scsl`,`scx`,`fzr`,`ddbh`,`wlxqlb`,`zt`) VALUES ('液压泵','PC-202407007','2024-07-03 08:30:00','2024-07-10 17:30:00','2024-07-03 08:30:00','2024-07-10 16:00:00','400','L3','张工','MO-202407007','泵体,活塞,密封圈','已完成');
INSERT INTO `crpm_13465a_9cdb2d` (`cpmc`,`scpch`,`jhkssj`,`jhjssj`,`sjkssj`,`sjjssj`,`scsl`,`scx`,`fzr`,`ddbh`,`wlxqlb`,`zt`) VALUES ('工业机器人','PC-202407008','2024-07-05 10:00:00','2024-07-15 16:00:00','2024-07-05 10:00:00','2024-07-15 17:30:00','200','L4','赵工','MO-202407008','机械臂,控制器,传感器','已完成');
INSERT INTO `crpm_13465a_9cdb2d` (`cpmc`,`scpch`,`jhkssj`,`jhjssj`,`sjkssj`,`sjjssj`,`scsl`,`scx`,`fzr`,`ddbh`,`wlxqlb`,`zt`) VALUES ('智能仪表','PC-202407009','2024-07-08 08:00:00','2024-07-14 17:00:00','2024-07-08 08:00:00','2024-07-14 16:30:00','1100','L1','王工','MO-202407009','显示屏,主板,外壳','已完成');
INSERT INTO `crpm_13465a_9cdb2d` (`cpmc`,`scpch`,`jhkssj`,`jhjssj`,`sjkssj`,`sjjssj`,`scsl`,`scx`,`fzr`,`ddbh`,`wlxqlb`,`zt`) VALUES ('自动化模块','PC-202407010','2024-07-10 09:30:00','2024-07-17 16:30:00','2024-07-10 09:30:00','2024-07-17 17:00:00','700','L2','李工','MO-202407010','集成模块,连接线,外壳','已完成');