CREATE TABLE `crpm_13465a_750af9` (
`id` BIGINT NOT NULL AUTO_INCREMENT PRIMARY KEY,
`cpmc` varchar(255) DEFAULT NULL COMMENT '产品名称',
`pch` varchar(255) DEFAULT NULL COMMENT '批次号',
`scrq` varchar(255) DEFAULT NULL COMMENT '生产日期',
`gqrq` varchar(255) DEFAULT NULL COMMENT '过期日期',
`zldj` varchar(255) DEFAULT NULL COMMENT '质量等级',
`jyy` varchar(255) DEFAULT NULL COMMENT '检验员',
`jyjg` varchar(255) DEFAULT NULL COMMENT '检验结果',
`bz` varchar(255) DEFAULT NULL COMMENT '备注'
);