INSERT INTO `crpm_49a150_4a0c6a` (`nhzl`,`dlxh`,`sxh`,`rqxh`,`zqxh`,`yskqxh`,`qtnyxh`,`nhcb`,`dwcpnh`,`nhjdl`,`jnl`,`jnxy`,`tpfl`,`tjpl`) VALUES ('12500kWh','8500kWh','320m³','1200m³','850GJ','680m³','0','¥18,500','0.45kWh/件','3.2%','410kWh','¥620','6.2tCO₂','0.2tCO₂');
INSERT INTO `crpm_49a150_4a0c6a` (`nhzl`,`dlxh`,`sxh`,`rqxh`,`zqxh`,`yskqxh`,`qtnyxh`,`nhcb`,`dwcpnh`,`nhjdl`,`jnl`,`jnxy`,`tpfl`,`tjpl`) VALUES ('13200kWh','9000kWh','350m³','1300m³','920GJ','720m³','0','¥19,800','0.48kWh/件','2.5%','340kWh','¥510','6.8tCO₂','0.17tCO₂');
INSERT INTO `crpm_49a150_4a0c6a` (`nhzl`,`dlxh`,`sxh`,`rqxh`,`zqxh`,`yskqxh`,`qtnyxh`,`nhcb`,`dwcpnh`,`nhjdl`,`jnl`,`jnxy`,`tpfl`,`tjpl`) VALUES ('12100kWh','8200kWh','310m³','1150m³','810GJ','650m³','0','¥17,900','0.44kWh/件','3.8%','470kWh','¥700','5.9tCO₂','0.23tCO₂');
INSERT INTO `crpm_49a150_4a0c6a` (`nhzl`,`dlxh`,`sxh`,`rqxh`,`zqxh`,`yskqxh`,`qtnyxh`,`nhcb`,`dwcpnh`,`nhjdl`,`jnl`,`jnxy`,`tpfl`,`tjpl`) VALUES ('13800kWh','9500kWh','370m³','1400m³','980GJ','750m³','0','¥20,700','0.50kWh/件','1.8%','250kWh','¥370','7.2tCO₂','0.13tCO₂');
INSERT INTO `crpm_49a150_4a0c6a` (`nhzl`,`dlxh`,`sxh`,`rqxh`,`zqxh`,`yskqxh`,`qtnyxh`,`nhcb`,`dwcpnh`,`nhjdl`,`jnl`,`jnxy`,`tpfl`,`tjpl`) VALUES ('12800kWh','8800kWh','330m³','1250m³','870GJ','690m³','0','¥19,200','0.46kWh/件','3.0%','390kWh','¥580','6.5tCO₂','0.2tCO₂');
INSERT INTO `crpm_49a150_4a0c6a` (`nhzl`,`dlxh`,`sxh`,`rqxh`,`zqxh`,`yskqxh`,`qtnyxh`,`nhcb`,`dwcpnh`,`nhjdl`,`jnl`,`jnxy`,`tpfl`,`tjpl`) VALUES ('13500kWh','9200kWh','360m³','1350m³','940GJ','730m³','0','¥20,300','0.49kWh/件','2.2%','300kWh','¥450','6.9tCO₂','0.15tCO₂');
INSERT INTO `crpm_49a150_4a0c6a` (`nhzl`,`dlxh`,`sxh`,`rqxh`,`zqxh`,`yskqxh`,`qtnyxh`,`nhcb`,`dwcpnh`,`nhjdl`,`jnl`,`jnxy`,`tpfl`,`tjpl`) VALUES ('11900kWh','8000kWh','300m³','1100m³','790GJ','630m³','0','¥17,600','0.43kWh/件','4.1%','510kWh','¥760','5.7tCO₂','0.26tCO₂');
INSERT INTO `crpm_49a150_4a0c6a` (`nhzl`,`dlxh`,`sxh`,`rqxh`,`zqxh`,`yskqxh`,`qtnyxh`,`nhcb`,`dwcpnh`,`nhjdl`,`jnl`,`jnxy`,`tpfl`,`tjpl`) VALUES ('14200kWh','9800kWh','380m³','1450m³','1020GJ','780m³','0','¥21,300','0.52kWh/件','1.5%','210kWh','¥310','7.4tCO₂','0.11tCO₂');
INSERT INTO `crpm_49a150_4a0c6a` (`nhzl`,`dlxh`,`sxh`,`rqxh`,`zqxh`,`yskqxh`,`qtnyxh`,`nhcb`,`dwcpnh`,`nhjdl`,`jnl`,`jnxy`,`tpfl`,`tjpl`) VALUES ('13100kWh','8900kWh','340m³','1300m³','900GJ','700m³','0','¥19,600','0.47kWh/件','2.8%','370kWh','¥550','6.6tCO₂','0.19tCO₂');
INSERT INTO `crpm_49a150_4a0c6a` (`nhzl`,`dlxh`,`sxh`,`rqxh`,`zqxh`,`yskqxh`,`qtnyxh`,`nhcb`,`dwcpnh`,`nhjdl`,`jnl`,`jnxy`,`tpfl`,`tjpl`) VALUES ('12400kWh','8400kWh','320m³','1200m³','830GJ','670m³','0','¥18,300','0.45kWh/件','3.5%','440kWh','¥660','6.1tCO₂','0.22tCO₂');