CREATE TABLE `crpm_bf21f2_8f2862` (
`id` BIGINT NOT NULL AUTO_INCREMENT PRIMARY KEY,
`zljcxm` varchar(255) DEFAULT NULL COMMENT '质量检测项目',
`zlbz` varchar(255) DEFAULT NULL COMMENT '质量标准',
`jcff` varchar(255) DEFAULT NULL COMMENT '检测方法',
`jcjg` varchar(255) DEFAULT NULL COMMENT '检测结果',
`clcs` varchar(255) DEFAULT NULL COMMENT '处理措施',
`fzr` varchar(255) DEFAULT NULL COMMENT '负责人',
`jcrq` varchar(255) DEFAULT NULL COMMENT '检测日期',
`bz` varchar(255) DEFAULT NULL COMMENT '备注'
);