CREATE TABLE `crpm_ad9ddd_6a4b12` (
`id` BIGINT NOT NULL AUTO_INCREMENT PRIMARY KEY,
`sbmc` varchar(255) DEFAULT NULL COMMENT '设备名称',
`nhz` varchar(255) DEFAULT NULL COMMENT '能耗值',
`yxsj` varchar(255) DEFAULT NULL COMMENT '运行时间',
`gl` varchar(255) DEFAULT NULL COMMENT '功率',
`zt` varchar(255) DEFAULT NULL COMMENT '状态',
`ljnh` varchar(255) DEFAULT NULL COMMENT '累计能耗',
`dy` varchar(255) DEFAULT NULL COMMENT '电压',
`dl` varchar(255) DEFAULT NULL COMMENT '电流',
`jcsjd` varchar(255) DEFAULT NULL COMMENT '监测时间点'
);