INSERT INTO `crpm_7135d3_b81ccb` (`sbbh`,`scpch`,`scsj`,`sbzt`,`cljs`,`gzcs`,`nhsj`,`wsdxx`,`whjl`,`czy`) VALUES ('SB-2024001','P20240615001','2024-06-15 08:00:00','运行中','1289','0','325.5kWh','25℃/45%RH','定期保养','张明');
INSERT INTO `crpm_7135d3_b81ccb` (`sbbh`,`scpch`,`scsj`,`sbzt`,`cljs`,`gzcs`,`nhsj`,`wsdxx`,`whjl`,`czy`) VALUES ('SB-2024002','P20240615002','2024-06-15 08:15:00','运行中','856','0','189.2kWh','23℃/42%RH','参数校准','李华');
INSERT INTO `crpm_7135d3_b81ccb` (`sbbh`,`scpch`,`scsj`,`sbzt`,`cljs`,`gzcs`,`nhsj`,`wsdxx`,`whjl`,`czy`) VALUES ('SB-2024003','P20240615003','2024-06-15 08:30:00','故障','0','1','0kWh','28℃/50%RH','温度传感器更换','王强');
INSERT INTO `crpm_7135d3_b81ccb` (`sbbh`,`scpch`,`scsj`,`sbzt`,`cljs`,`gzcs`,`nhsj`,`wsdxx`,`whjl`,`czy`) VALUES ('SB-2024004','P20240615004','2024-06-15 09:00:00','运行中','2156','0','489.3kWh','26℃/47%RH','传送带清洁','赵芳');
INSERT INTO `crpm_7135d3_b81ccb` (`sbbh`,`scpch`,`scsj`,`sbzt`,`cljs`,`gzcs`,`nhsj`,`wsdxx`,`whjl`,`czy`) VALUES ('SB-2024005','P20240615005','2024-06-15 09:15:00','运行中','1568','0','320.7kWh','24℃/43%RH','轴承润滑','陈杰');
INSERT INTO `crpm_7135d3_b81ccb` (`sbbh`,`scpch`,`scsj`,`sbzt`,`cljs`,`gzcs`,`nhsj`,`wsdxx`,`whjl`,`czy`) VALUES ('SB-2024006','P20240615006','2024-06-15 09:30:00','待机','0','0','5.2kWh','22℃/40%RH','无','周琳');
INSERT INTO `crpm_7135d3_b81ccb` (`sbbh`,`scpch`,`scsj`,`sbzt`,`cljs`,`gzcs`,`nhsj`,`wsdxx`,`whjl`,`czy`) VALUES ('SB-2024007','P20240615007','2024-06-15 10:00:00','运行中','987','0','215.8kWh','25℃/44%RH','传感器校准','吴伟');
INSERT INTO `crpm_7135d3_b81ccb` (`sbbh`,`scpch`,`scsj`,`sbzt`,`cljs`,`gzcs`,`nhsj`,`wsdxx`,`whjl`,`czy`) VALUES ('SB-2024008','P20240615008','2024-06-15 10:15:00','运行中','1763','0','389.4kWh','27℃/48%RH','刀具更换','郑浩');
INSERT INTO `crpm_7135d3_b81ccb` (`sbbh`,`scpch`,`scsj`,`sbzt`,`cljs`,`gzcs`,`nhsj`,`wsdxx`,`whjl`,`czy`) VALUES ('SB-2024009','P20240615009','2024-06-15 10:30:00','故障','0','1','0kWh','29℃/51%RH','控制系统重启','孙丽');
INSERT INTO `crpm_7135d3_b81ccb` (`sbbh`,`scpch`,`scsj`,`sbzt`,`cljs`,`gzcs`,`nhsj`,`wsdxx`,`whjl`,`czy`) VALUES ('SB-2024010','P20240615010','2024-06-15 11:00:00','运行中','1325','0','278.6kWh','25℃/46%RH','参数优化','林凯');