INSERT INTO `crpm_ea3a1a_d80717` (`sbmc`,`smsj`,`xjry`,`sbzt`,`bzxx`,`ewmnr`) VALUES ('注塑机','2024-08-01 08:00:00','张明','运行中','设备正常，温度压力在范围内','https://www.aimzhu.com/copyright/route/crpm/pages/code9/ea3a1a/qr/SB-2024001');
INSERT INTO `crpm_ea3a1a_d80717` (`sbmc`,`smsj`,`xjry`,`sbzt`,`bzxx`,`ewmnr`) VALUES ('冷却塔','2024-08-01 08:30:00','李华','运行中','水温25℃，风机正常','https://www.aimzhu.com/copyright/route/crpm/pages/code9/ea3a1a/qr/SB-2024002');
INSERT INTO `crpm_ea3a1a_d80717` (`sbmc`,`smsj`,`xjry`,`sbzt`,`bzxx`,`ewmnr`) VALUES ('压缩机','2024-08-01 09:00:00','王强','运行中','排气压力0.8MPa，油温正常','https://www.aimzhu.com/copyright/route/crpm/pages/code9/ea3a1a/qr/SB-2024003');
INSERT INTO `crpm_ea3a1a_d80717` (`sbmc`,`smsj`,`xjry`,`sbzt`,`bzxx`,`ewmnr`) VALUES ('烘干机','2024-08-01 09:30:00','赵芳','运行中','温度120℃，烘干效果良好','https://www.aimzhu.com/copyright/route/crpm/pages/code9/ea3a1a/qr/SB-2024004');
INSERT INTO `crpm_ea3a1a_d80717` (`sbmc`,`smsj`,`xjry`,`sbzt`,`bzxx`,`ewmnr`) VALUES ('传送带','2024-08-01 10:00:00','陈杰','运行中','速度50m/min，无跑偏现象','https://www.aimzhu.com/copyright/route/crpm/pages/code9/ea3a1a/qr/SB-2024005');
INSERT INTO `crpm_ea3a1a_d80717` (`sbmc`,`smsj`,`xjry`,`sbzt`,`bzxx`,`ewmnr`) VALUES ('搅拌机','2024-08-01 10:30:00','周琳','运行中','电机电流正常，搅拌均匀','https://www.aimzhu.com/copyright/route/crpm/pages/code9/ea3a1a/qr/SB-2024006');
INSERT INTO `crpm_ea3a1a_d80717` (`sbmc`,`smsj`,`xjry`,`sbzt`,`bzxx`,`ewmnr`) VALUES ('真空泵','2024-08-01 11:00:00','吴伟','运行中','真空度-0.09MPa，泵油正常','https://www.aimzhu.com/copyright/route/crpm/pages/code9/ea3a1a/qr/SB-2024007');
INSERT INTO `crpm_ea3a1a_d80717` (`sbmc`,`smsj`,`xjry`,`sbzt`,`bzxx`,`ewmnr`) VALUES ('切割机','2024-08-01 11:30:00','郑浩','运行中','切割精度±0.1mm，正常','https://www.aimzhu.com/copyright/route/crpm/pages/code9/ea3a1a/qr/SB-2024008');
INSERT INTO `crpm_ea3a1a_d80717` (`sbmc`,`smsj`,`xjry`,`sbzt`,`bzxx`,`ewmnr`) VALUES ('风机','2024-08-01 12:00:00','孙丽','运行中','风量正常，振动值<2.8mm/s','https://www.aimzhu.com/copyright/route/crpm/pages/code9/ea3a1a/qr/SB-2024009');
INSERT INTO `crpm_ea3a1a_d80717` (`sbmc`,`smsj`,`xjry`,`sbzt`,`bzxx`,`ewmnr`) VALUES ('包装机','2024-08-01 12:30:00','林凯','运行中','包装速度30件/分钟，正常','https://www.aimzhu.com/copyright/route/crpm/pages/code9/ea3a1a/qr/SB-2024010');
INSERT INTO `crpm_ea3a1a_d80717` (`sbmc`,`smsj`,`xjry`,`sbzt`,`bzxx`,`ewmnr`) VALUES ('注塑机','2024-08-01 17:30:00','张明','停机','生产任务完成，正常关机','https://www.aimzhu.com/copyright/route/crpm/pages/code9/ea3a1a/qr/SB-2024001');
INSERT INTO `crpm_ea3a1a_d80717` (`sbmc`,`smsj`,`xjry`,`sbzt`,`bzxx`,`ewmnr`) VALUES ('冷却塔','2024-08-01 18:00:00','李华','停机','清洗过滤网，准备停机维护','https://www.aimzhu.com/copyright/route/crpm/pages/code9/ea3a1a/qr/SB-2024002');
INSERT INTO `crpm_ea3a1a_d80717` (`sbmc`,`smsj`,`xjry`,`sbzt`,`bzxx`,`ewmnr`) VALUES ('压缩机','2024-08-01 18:30:00','王强','停机','记录运行参数后正常停机','https://www.aimzhu.com/copyright/route/crpm/pages/code9/ea3a1a/qr/SB-2024003');
INSERT INTO `crpm_ea3a1a_d80717` (`sbmc`,`smsj`,`xjry`,`sbzt`,`bzxx`,`ewmnr`) VALUES ('烘干机','2024-08-01 19:00:00','赵芳','停机','温度降至50℃，关闭电源','https://www.aimzhu.com/copyright/route/crpm/pages/code9/ea3a1a/qr/SB-2024004');
INSERT INTO `crpm_ea3a1a_d80717` (`sbmc`,`smsj`,`xjry`,`sbzt`,`bzxx`,`ewmnr`) VALUES ('传送带','2024-08-01 19:30:00','陈杰','停机','清理残留物料后关机','https://www.aimzhu.com/copyright/route/crpm/pages/code9/ea3a1a/qr/SB-2024005');
INSERT INTO `crpm_ea3a1a_d80717` (`sbmc`,`smsj`,`xjry`,`sbzt`,`bzxx`,`ewmnr`) VALUES ('注塑机','2024-08-02 08:00:00','张明','运行中','更换模具后启动，参数正常','https://www.aimzhu.com/copyright/route/crpm/pages/code9/ea3a1a/qr/SB-2024001');
INSERT INTO `crpm_ea3a1a_d80717` (`sbmc`,`smsj`,`xjry`,`sbzt`,`bzxx`,`ewmnr`) VALUES ('冷却塔','2024-08-02 08:30:00','李华','运行中','发现风机振动偏大，需调整','https://www.aimzhu.com/copyright/route/crpm/pages/code9/ea3a1a/qr/SB-2024002');
INSERT INTO `crpm_ea3a1a_d80717` (`sbmc`,`smsj`,`xjry`,`sbzt`,`bzxx`,`ewmnr`) VALUES ('压缩机','2024-08-02 09:00:00','王强','运行中','排气温度略高，检查冷却系统','https://www.aimzhu.com/copyright/route/crpm/pages/code9/ea3a1a/qr/SB-2024003');
INSERT INTO `crpm_ea3a1a_d80717` (`sbmc`,`smsj`,`xjry`,`sbzt`,`bzxx`,`ewmnr`) VALUES ('烘干机','2024-08-02 09:30:00','赵芳','运行中','加热元件正常，温度稳定','https://www.aimzhu.com/copyright/route/crpm/pages/code9/ea3a1a/qr/SB-2024004');
INSERT INTO `crpm_ea3a1a_d80717` (`sbmc`,`smsj`,`xjry`,`sbzt`,`bzxx`,`ewmnr`) VALUES ('传送带','2024-08-02 10:00:00','陈杰','运行中','皮带张紧度不足，需调整','https://www.aimzhu.com/copyright/route/crpm/pages/code9/ea3a1a/qr/SB-2024005');
INSERT INTO `crpm_ea3a1a_d80717` (`sbmc`,`smsj`,`xjry`,`sbzt`,`bzxx`,`ewmnr`) VALUES ('注塑机','2024-08-01 08:00:00','张明','运行中','设备正常，温度压力在范围内','https://www.aimzhu.com/copyright/route/crpm/pages/code9/ea3a1a/qr/SB-2024001');
INSERT INTO `crpm_ea3a1a_d80717` (`sbmc`,`smsj`,`xjry`,`sbzt`,`bzxx`,`ewmnr`) VALUES ('冷却塔','2024-08-01 08:30:00','李华','运行中','水温25℃，风机正常','https://www.aimzhu.com/copyright/route/crpm/pages/code9/ea3a1a/qr/SB-2024002');
INSERT INTO `crpm_ea3a1a_d80717` (`sbmc`,`smsj`,`xjry`,`sbzt`,`bzxx`,`ewmnr`) VALUES ('压缩机','2024-08-01 09:00:00','王强','运行中','排气压力0.8MPa，油温正常','https://www.aimzhu.com/copyright/route/crpm/pages/code9/ea3a1a/qr/SB-2024003');
INSERT INTO `crpm_ea3a1a_d80717` (`sbmc`,`smsj`,`xjry`,`sbzt`,`bzxx`,`ewmnr`) VALUES ('烘干机','2024-08-01 09:30:00','赵芳','运行中','温度120℃，烘干效果良好','https://www.aimzhu.com/copyright/route/crpm/pages/code9/ea3a1a/qr/SB-2024004');
INSERT INTO `crpm_ea3a1a_d80717` (`sbmc`,`smsj`,`xjry`,`sbzt`,`bzxx`,`ewmnr`) VALUES ('传送带','2024-08-01 10:00:00','陈杰','运行中','速度50m/min，无跑偏现象','https://www.aimzhu.com/copyright/route/crpm/pages/code9/ea3a1a/qr/SB-2024005');
INSERT INTO `crpm_ea3a1a_d80717` (`sbmc`,`smsj`,`xjry`,`sbzt`,`bzxx`,`ewmnr`) VALUES ('搅拌机','2024-08-01 10:30:00','周琳','运行中','电机电流正常，搅拌均匀','https://www.aimzhu.com/copyright/route/crpm/pages/code9/ea3a1a/qr/SB-2024006');
INSERT INTO `crpm_ea3a1a_d80717` (`sbmc`,`smsj`,`xjry`,`sbzt`,`bzxx`,`ewmnr`) VALUES ('真空泵','2024-08-01 11:00:00','吴伟','运行中','真空度-0.09MPa，泵油正常','https://www.aimzhu.com/copyright/route/crpm/pages/code9/ea3a1a/qr/SB-2024007');
INSERT INTO `crpm_ea3a1a_d80717` (`sbmc`,`smsj`,`xjry`,`sbzt`,`bzxx`,`ewmnr`) VALUES ('切割机','2024-08-01 11:30:00','郑浩','运行中','切割精度±0.1mm，正常','https://www.aimzhu.com/copyright/route/crpm/pages/code9/ea3a1a/qr/SB-2024008');
INSERT INTO `crpm_ea3a1a_d80717` (`sbmc`,`smsj`,`xjry`,`sbzt`,`bzxx`,`ewmnr`) VALUES ('风机','2024-08-01 12:00:00','孙丽','运行中','风量正常，振动值<2.8mm/s','https://www.aimzhu.com/copyright/route/crpm/pages/code9/ea3a1a/qr/SB-2024009');
INSERT INTO `crpm_ea3a1a_d80717` (`sbmc`,`smsj`,`xjry`,`sbzt`,`bzxx`,`ewmnr`) VALUES ('包装机','2024-08-01 12:30:00','林凯','运行中','包装速度30件/分钟，正常','https://www.aimzhu.com/copyright/route/crpm/pages/code9/ea3a1a/qr/SB-2024010');
INSERT INTO `crpm_ea3a1a_d80717` (`sbmc`,`smsj`,`xjry`,`sbzt`,`bzxx`,`ewmnr`) VALUES ('注塑机','2024-08-01 17:30:00','张明','停机','生产任务完成，正常关机','https://www.aimzhu.com/copyright/route/crpm/pages/code9/ea3a1a/qr/SB-2024001');
INSERT INTO `crpm_ea3a1a_d80717` (`sbmc`,`smsj`,`xjry`,`sbzt`,`bzxx`,`ewmnr`) VALUES ('冷却塔','2024-08-01 18:00:00','李华','停机','清洗过滤网，准备停机维护','https://www.aimzhu.com/copyright/route/crpm/pages/code9/ea3a1a/qr/SB-2024002');
INSERT INTO `crpm_ea3a1a_d80717` (`sbmc`,`smsj`,`xjry`,`sbzt`,`bzxx`,`ewmnr`) VALUES ('压缩机','2024-08-01 18:30:00','王强','停机','记录运行参数后正常停机','https://www.aimzhu.com/copyright/route/crpm/pages/code9/ea3a1a/qr/SB-2024003');
INSERT INTO `crpm_ea3a1a_d80717` (`sbmc`,`smsj`,`xjry`,`sbzt`,`bzxx`,`ewmnr`) VALUES ('烘干机','2024-08-01 19:00:00','赵芳','停机','温度降至50℃，关闭电源','https://www.aimzhu.com/copyright/route/crpm/pages/code9/ea3a1a/qr/SB-2024004');
INSERT INTO `crpm_ea3a1a_d80717` (`sbmc`,`smsj`,`xjry`,`sbzt`,`bzxx`,`ewmnr`) VALUES ('传送带','2024-08-01 19:30:00','陈杰','停机','清理残留物料后关机','https://www.aimzhu.com/copyright/route/crpm/pages/code9/ea3a1a/qr/SB-2024005');
INSERT INTO `crpm_ea3a1a_d80717` (`sbmc`,`smsj`,`xjry`,`sbzt`,`bzxx`,`ewmnr`) VALUES ('注塑机','2024-08-02 08:00:00','张明','运行中','更换模具后启动，参数正常','https://www.aimzhu.com/copyright/route/crpm/pages/code9/ea3a1a/qr/SB-2024001');
INSERT INTO `crpm_ea3a1a_d80717` (`sbmc`,`smsj`,`xjry`,`sbzt`,`bzxx`,`ewmnr`) VALUES ('冷却塔','2024-08-02 08:30:00','李华','运行中','发现风机振动偏大，需调整','https://www.aimzhu.com/copyright/route/crpm/pages/code9/ea3a1a/qr/SB-2024002');
INSERT INTO `crpm_ea3a1a_d80717` (`sbmc`,`smsj`,`xjry`,`sbzt`,`bzxx`,`ewmnr`) VALUES ('压缩机','2024-08-02 09:00:00','王强','运行中','排气温度略高，检查冷却系统','https://www.aimzhu.com/copyright/route/crpm/pages/code9/ea3a1a/qr/SB-2024003');
INSERT INTO `crpm_ea3a1a_d80717` (`sbmc`,`smsj`,`xjry`,`sbzt`,`bzxx`,`ewmnr`) VALUES ('烘干机','2024-08-02 09:30:00','赵芳','运行中','加热元件正常，温度稳定','https://www.aimzhu.com/copyright/route/crpm/pages/code9/ea3a1a/qr/SB-2024004');
INSERT INTO `crpm_ea3a1a_d80717` (`sbmc`,`smsj`,`xjry`,`sbzt`,`bzxx`,`ewmnr`) VALUES ('传送带','2024-08-02 10:00:00','陈杰','运行中','皮带张紧度不足，需调整','https://www.aimzhu.com/copyright/route/crpm/pages/code9/ea3a1a/qr/SB-2024005');