CREATE TABLE `crpm_7135d3_4169f5` (
`id` BIGINT NOT NULL AUTO_INCREMENT PRIMARY KEY,
`gzsbbh` varchar(255) DEFAULT NULL COMMENT '故障设备编号',
`gzlx` varchar(255) DEFAULT NULL COMMENT '故障类型',
`gzjb` varchar(255) DEFAULT NULL COMMENT '故障级别',
`gzfssj` varchar(255) DEFAULT NULL COMMENT '故障发生时间',
`gzms` varchar(255) DEFAULT NULL COMMENT '故障描述',
`clzt` varchar(255) DEFAULT NULL COMMENT '处理状态',
`fzr` varchar(255) DEFAULT NULL COMMENT '负责人',
`yjjjsj` varchar(255) DEFAULT NULL COMMENT '预计解决时间',
`sjjjsj` varchar(255) DEFAULT NULL COMMENT '实际解决时间',
`gzyxfw` varchar(255) DEFAULT NULL COMMENT '故障影响范围',
`bzxx` varchar(255) DEFAULT NULL COMMENT '备注信息'
);