CREATE TABLE `crpm_49a150_0b46f6` (
`id` BIGINT NOT NULL AUTO_INCREMENT PRIMARY KEY,
`wd` varchar(255) DEFAULT NULL COMMENT '温度',
`sd` varchar(255) DEFAULT NULL COMMENT '湿度',
`_p_m25` varchar(255) DEFAULT NULL COMMENT 'PM25',
`_p_m10` varchar(255) DEFAULT NULL COMMENT 'PM10',
`_c_o2` varchar(255) DEFAULT NULL COMMENT 'CO2',
`zs` varchar(255) DEFAULT NULL COMMENT '噪声',
`gzqd` varchar(255) DEFAULT NULL COMMENT '光照强度',
`qy` varchar(255) DEFAULT NULL COMMENT '气压'
);