CREATE TABLE `crpm_49a150_4a0c6a` (
`id` BIGINT NOT NULL AUTO_INCREMENT PRIMARY KEY,
`nhzl` varchar(255) DEFAULT NULL COMMENT '能耗总量',
`dlxh` varchar(255) DEFAULT NULL COMMENT '电力消耗',
`sxh` varchar(255) DEFAULT NULL COMMENT '水消耗',
`rqxh` varchar(255) DEFAULT NULL COMMENT '燃气消耗',
`zqxh` varchar(255) DEFAULT NULL COMMENT '蒸汽消耗',
`yskqxh` varchar(255) DEFAULT NULL COMMENT '压缩空气消耗',
`qtnyxh` varchar(255) DEFAULT NULL COMMENT '其他能源消耗',
`nhcb` varchar(255) DEFAULT NULL COMMENT '能耗成本',
`dwcpnh` varchar(255) DEFAULT NULL COMMENT '单位产品能耗',
`nhjdl` varchar(255) DEFAULT NULL COMMENT '能耗降低率',
`jnl` varchar(255) DEFAULT NULL COMMENT '节能量',
`jnxy` varchar(255) DEFAULT NULL COMMENT '节能效益',
`tpfl` varchar(255) DEFAULT NULL COMMENT '碳排放量',
`tjpl` varchar(255) DEFAULT NULL COMMENT '碳减排量'
);