INSERT INTO `crpm_ea3a1a_178cdf` (`sbmc`,`sbxh`,`gzms`,`bxsj`,`yjxfsj`,`sjxfsj`,`wxry`,`wxzt`,`wxfy`,`bz`) VALUES ('注塑机','HTF160X1','液压系统漏油','2024-08-05 09:30:00','2024-08-05 17:00:00','2024-08-05 16:45:00','王强','已完成','1200元','更换密封圈，测试正常');
INSERT INTO `crpm_ea3a1a_178cdf` (`sbmc`,`sbxh`,`gzms`,`bxsj`,`yjxfsj`,`sjxfsj`,`wxry`,`wxzt`,`wxfy`,`bz`) VALUES ('冷却塔','CT-300','风机异响','2024-08-08 14:15:00','2024-08-09 12:00:00','2024-08-09 11:30:00','吴伟','已完成','850元','更换风机轴承，平衡校正');
INSERT INTO `crpm_ea3a1a_178cdf` (`sbmc`,`sbxh`,`gzms`,`bxsj`,`yjxfsj`,`sjxfsj`,`wxry`,`wxzt`,`wxfy`,`bz`) VALUES ('压缩机','GA110','排气温度过高','2024-08-12 10:00:00','2024-08-12 18:00:00','2024-08-12 17:15:00','林凯','已完成','1500元','清洗冷却器，更换温控阀');
INSERT INTO `crpm_ea3a1a_178cdf` (`sbmc`,`sbxh`,`gzms`,`bxsj`,`yjxfsj`,`sjxfsj`,`wxry`,`wxzt`,`wxfy`,`bz`) VALUES ('烘干机','DH-500','加热元件故障','2024-08-15 08:45:00','2024-08-15 16:00:00','2024-08-15 15:30:00','郑浩','已完成','2100元','更换加热管，校准温度传感器');
INSERT INTO `crpm_ea3a1a_178cdf` (`sbmc`,`sbxh`,`gzms`,`bxsj`,`yjxfsj`,`sjxfsj`,`wxry`,`wxzt`,`wxfy`,`bz`) VALUES ('传送带','BELT-200','皮带打滑','2024-08-18 13:30:00','2024-08-18 17:30:00','2024-08-18 17:00:00','孙丽','已完成','650元','调整张紧装置，清洁皮带');
INSERT INTO `crpm_ea3a1a_178cdf` (`sbmc`,`sbxh`,`gzms`,`bxsj`,`yjxfsj`,`sjxfsj`,`wxry`,`wxzt`,`wxfy`,`bz`) VALUES ('搅拌机','MIX-150','电机过载','2024-08-22 11:15:00','2024-08-23 10:00:00','2024-08-23 09:45:00','赵芳','已完成','980元','更换减速机润滑油，清理杂物');
INSERT INTO `crpm_ea3a1a_178cdf` (`sbmc`,`sbxh`,`gzms`,`bxsj`,`yjxfsj`,`sjxfsj`,`wxry`,`wxzt`,`wxfy`,`bz`) VALUES ('真空泵','VP-60','真空度不足','2024-08-25 09:00:00','2024-08-25 17:00:00','2024-08-25 16:30:00','张明','已完成','1350元','更换密封件，检修气路');
INSERT INTO `crpm_ea3a1a_178cdf` (`sbmc`,`sbxh`,`gzms`,`bxsj`,`yjxfsj`,`sjxfsj`,`wxry`,`wxzt`,`wxfy`,`bz`) VALUES ('切割机','CUT-200','切割精度下降','2024-08-28 14:45:00','2024-08-29 12:00:00','2024-08-29 11:30:00','李华','已完成','1800元','更换切割刀片，校准导轨');
INSERT INTO `crpm_ea3a1a_178cdf` (`sbmc`,`sbxh`,`gzms`,`bxsj`,`yjxfsj`,`sjxfsj`,`wxry`,`wxzt`,`wxfy`,`bz`) VALUES ('风机','FAN-100','振动值超标','2024-09-01 10:30:00','2024-09-01 18:30:00','2024-09-01 18:00:00','陈杰','已完成','750元','调整风机叶轮，加固底座');
INSERT INTO `crpm_ea3a1a_178cdf` (`sbmc`,`sbxh`,`gzms`,`bxsj`,`yjxfsj`,`sjxfsj`,`wxry`,`wxzt`,`wxfy`,`bz`) VALUES ('包装机','PACK-300','控制系统故障','2024-09-05 08:15:00','2024-09-05 16:15:00','2024-09-05 15:45:00','周琳','已完成','2400元','更换PLC模块，重新编程');
INSERT INTO `crpm_ea3a1a_178cdf` (`sbmc`,`sbxh`,`gzms`,`bxsj`,`yjxfsj`,`sjxfsj`,`wxry`,`wxzt`,`wxfy`,`bz`) VALUES ('注塑机','HTF160X1','液压系统漏油','2024-08-05 09:30:00','2024-08-05 17:00:00','2024-08-05 16:45:00','王强','已完成','1200元','更换密封圈，测试正常');
INSERT INTO `crpm_ea3a1a_178cdf` (`sbmc`,`sbxh`,`gzms`,`bxsj`,`yjxfsj`,`sjxfsj`,`wxry`,`wxzt`,`wxfy`,`bz`) VALUES ('冷却塔','CT-300','风机异响','2024-08-08 14:15:00','2024-08-09 12:00:00','2024-08-09 11:30:00','吴伟','已完成','850元','更换风机轴承，平衡校正');
INSERT INTO `crpm_ea3a1a_178cdf` (`sbmc`,`sbxh`,`gzms`,`bxsj`,`yjxfsj`,`sjxfsj`,`wxry`,`wxzt`,`wxfy`,`bz`) VALUES ('压缩机','GA110','排气温度过高','2024-08-12 10:00:00','2024-08-12 18:00:00','2024-08-12 17:15:00','林凯','已完成','1500元','清洗冷却器，更换温控阀');
INSERT INTO `crpm_ea3a1a_178cdf` (`sbmc`,`sbxh`,`gzms`,`bxsj`,`yjxfsj`,`sjxfsj`,`wxry`,`wxzt`,`wxfy`,`bz`) VALUES ('烘干机','DH-500','加热元件故障','2024-08-15 08:45:00','2024-08-15 16:00:00','2024-08-15 15:30:00','郑浩','已完成','2100元','更换加热管，校准温度传感器');
INSERT INTO `crpm_ea3a1a_178cdf` (`sbmc`,`sbxh`,`gzms`,`bxsj`,`yjxfsj`,`sjxfsj`,`wxry`,`wxzt`,`wxfy`,`bz`) VALUES ('传送带','BELT-200','皮带打滑','2024-08-18 13:30:00','2024-08-18 17:30:00','2024-08-18 17:00:00','孙丽','已完成','650元','调整张紧装置，清洁皮带');
INSERT INTO `crpm_ea3a1a_178cdf` (`sbmc`,`sbxh`,`gzms`,`bxsj`,`yjxfsj`,`sjxfsj`,`wxry`,`wxzt`,`wxfy`,`bz`) VALUES ('搅拌机','MIX-150','电机过载','2024-08-22 11:15:00','2024-08-23 10:00:00','2024-08-23 09:45:00','赵芳','已完成','980元','更换减速机润滑油，清理杂物');
INSERT INTO `crpm_ea3a1a_178cdf` (`sbmc`,`sbxh`,`gzms`,`bxsj`,`yjxfsj`,`sjxfsj`,`wxry`,`wxzt`,`wxfy`,`bz`) VALUES ('真空泵','VP-60','真空度不足','2024-08-25 09:00:00','2024-08-25 17:00:00','2024-08-25 16:30:00','张明','已完成','1350元','更换密封件，检修气路');
INSERT INTO `crpm_ea3a1a_178cdf` (`sbmc`,`sbxh`,`gzms`,`bxsj`,`yjxfsj`,`sjxfsj`,`wxry`,`wxzt`,`wxfy`,`bz`) VALUES ('切割机','CUT-200','切割精度下降','2024-08-28 14:45:00','2024-08-29 12:00:00','2024-08-29 11:30:00','李华','已完成','1800元','更换切割刀片，校准导轨');
INSERT INTO `crpm_ea3a1a_178cdf` (`sbmc`,`sbxh`,`gzms`,`bxsj`,`yjxfsj`,`sjxfsj`,`wxry`,`wxzt`,`wxfy`,`bz`) VALUES ('风机','FAN-100','振动值超标','2024-09-01 10:30:00','2024-09-01 18:30:00','2024-09-01 18:00:00','陈杰','已完成','750元','调整风机叶轮，加固底座');
INSERT INTO `crpm_ea3a1a_178cdf` (`sbmc`,`sbxh`,`gzms`,`bxsj`,`yjxfsj`,`sjxfsj`,`wxry`,`wxzt`,`wxfy`,`bz`) VALUES ('包装机','PACK-300','控制系统故障','2024-09-05 08:15:00','2024-09-05 16:15:00','2024-09-05 15:45:00','周琳','已完成','2400元','更换PLC模块，重新编程');