INSERT INTO `crpm_7135d3_c1d334` (`sbmc`,`sbzt`,`sjcjsj`,`scsl`,`gzcs`,`whjl`,`czry`,`bzxx`) VALUES ('注塑机-A300','运行中','2024-06-15 08:30:00','156','0','定期保养','张明','参数稳定');
INSERT INTO `crpm_7135d3_c1d334` (`sbmc`,`sbzt`,`sjcjsj`,`scsl`,`gzcs`,`whjl`,`czry`,`bzxx`) VALUES ('冷却塔-CL-120','运行中','2024-06-15 08:45:00','0','0','清洗滤网','李华','冷却效果良好');
INSERT INTO `crpm_7135d3_c1d334` (`sbmc`,`sbzt`,`sjcjsj`,`scsl`,`gzcs`,`whjl`,`czry`,`bzxx`) VALUES ('压缩机-YC-75','运行中','2024-06-15 09:00:00','0','0','更换滤芯','王强','压力稳定在12MPa');
INSERT INTO `crpm_7135d3_c1d334` (`sbmc`,`sbzt`,`sjcjsj`,`scsl`,`gzcs`,`whjl`,`czry`,`bzxx`) VALUES ('烘干炉-HG-500','故障','2024-06-15 09:15:00','0','1','更换加热元件','赵芳','等待验收');
INSERT INTO `crpm_7135d3_c1d334` (`sbmc`,`sbzt`,`sjcjsj`,`scsl`,`gzcs`,`whjl`,`czry`,`bzxx`) VALUES ('传送带-Belt-08','运行中','2024-06-15 09:30:00','320','0','张紧度调整','陈杰','输送平稳');
INSERT INTO `crpm_7135d3_c1d334` (`sbmc`,`sbzt`,`sjcjsj`,`scsl`,`gzcs`,`whjl`,`czry`,`bzxx`) VALUES ('搅拌机-MJ-150','运行中','2024-06-15 09:45:00','85','0','润滑检查','周琳','混合均匀度达标');
INSERT INTO `crpm_7135d3_c1d334` (`sbmc`,`sbzt`,`sjcjsj`,`scsl`,`gzcs`,`whjl`,`czry`,`bzxx`) VALUES ('真空泵-ZB-60','运行中','2024-06-15 10:00:00','0','0','更换密封件','吴伟','真空度稳定');
INSERT INTO `crpm_7135d3_c1d334` (`sbmc`,`sbzt`,`sjcjsj`,`scsl`,`gzcs`,`whjl`,`czry`,`bzxx`) VALUES ('切割机-QG-250','运行中','2024-06-15 10:15:00','128','0','更换刀具','郑浩','切割精度±0.1mm');
INSERT INTO `crpm_7135d3_c1d334` (`sbmc`,`sbzt`,`sjcjsj`,`scsl`,`gzcs`,`whjl`,`czry`,`bzxx`) VALUES ('风机-FJ-110','故障','2024-06-15 10:30:00','0','1','更换电机轴承','孙丽','等待测试');
INSERT INTO `crpm_7135d3_c1d334` (`sbmc`,`sbzt`,`sjcjsj`,`scsl`,`gzcs`,`whjl`,`czry`,`bzxx`) VALUES ('包装机-BZ-400','运行中','2024-06-15 10:45:00','215','0','传送带校准','林凯','包装速度提升5%');