INSERT INTO `crpm_ea3a1a_cdfd45` (`xjsbmc`,`xjry`,`xjrq`,`xjjg`,`ycms`,`clcs`,`xcxjrq`) VALUES ('注塑机','张明','2024-08-01','合格','','','2024-08-02');
INSERT INTO `crpm_ea3a1a_cdfd45` (`xjsbmc`,`xjry`,`xjrq`,`xjjg`,`ycms`,`clcs`,`xcxjrq`) VALUES ('冷却塔','李华','2024-08-01','合格','','','2024-08-02');
INSERT INTO `crpm_ea3a1a_cdfd45` (`xjsbmc`,`xjry`,`xjrq`,`xjjg`,`ycms`,`clcs`,`xcxjrq`) VALUES ('压缩机','王强','2024-08-01','合格','','','2024-08-02');
INSERT INTO `crpm_ea3a1a_cdfd45` (`xjsbmc`,`xjry`,`xjrq`,`xjjg`,`ycms`,`clcs`,`xcxjrq`) VALUES ('烘干机','赵芳','2024-08-01','合格','','','2024-08-02');
INSERT INTO `crpm_ea3a1a_cdfd45` (`xjsbmc`,`xjry`,`xjrq`,`xjjg`,`ycms`,`clcs`,`xcxjrq`) VALUES ('传送带','陈杰','2024-08-01','合格','','','2024-08-02');
INSERT INTO `crpm_ea3a1a_cdfd45` (`xjsbmc`,`xjry`,`xjrq`,`xjjg`,`ycms`,`clcs`,`xcxjrq`) VALUES ('搅拌机','周琳','2024-08-01','合格','','','2024-08-02');
INSERT INTO `crpm_ea3a1a_cdfd45` (`xjsbmc`,`xjry`,`xjrq`,`xjjg`,`ycms`,`clcs`,`xcxjrq`) VALUES ('真空泵','吴伟','2024-08-01','合格','','','2024-08-02');
INSERT INTO `crpm_ea3a1a_cdfd45` (`xjsbmc`,`xjry`,`xjrq`,`xjjg`,`ycms`,`clcs`,`xcxjrq`) VALUES ('切割机','郑浩','2024-08-01','合格','','','2024-08-02');
INSERT INTO `crpm_ea3a1a_cdfd45` (`xjsbmc`,`xjry`,`xjrq`,`xjjg`,`ycms`,`clcs`,`xcxjrq`) VALUES ('风机','孙丽','2024-08-01','合格','','','2024-08-02');
INSERT INTO `crpm_ea3a1a_cdfd45` (`xjsbmc`,`xjry`,`xjrq`,`xjjg`,`ycms`,`clcs`,`xcxjrq`) VALUES ('包装机','林凯','2024-08-01','合格','','','2024-08-02');
INSERT INTO `crpm_ea3a1a_cdfd45` (`xjsbmc`,`xjry`,`xjrq`,`xjjg`,`ycms`,`clcs`,`xcxjrq`) VALUES ('注塑机','张明','2024-08-02','合格','','','2024-08-03');
INSERT INTO `crpm_ea3a1a_cdfd45` (`xjsbmc`,`xjry`,`xjrq`,`xjjg`,`ycms`,`clcs`,`xcxjrq`) VALUES ('冷却塔','李华','2024-08-02','不合格','风机振动偏大','调整风机平衡','2024-08-03');
INSERT INTO `crpm_ea3a1a_cdfd45` (`xjsbmc`,`xjry`,`xjrq`,`xjjg`,`ycms`,`clcs`,`xcxjrq`) VALUES ('压缩机','王强','2024-08-02','合格','','','2024-08-03');
INSERT INTO `crpm_ea3a1a_cdfd45` (`xjsbmc`,`xjry`,`xjrq`,`xjjg`,`ycms`,`clcs`,`xcxjrq`) VALUES ('烘干机','赵芳','2024-08-02','合格','','','2024-08-03');
INSERT INTO `crpm_ea3a1a_cdfd45` (`xjsbmc`,`xjry`,`xjrq`,`xjjg`,`ycms`,`clcs`,`xcxjrq`) VALUES ('传送带','陈杰','2024-08-02','不合格','皮带张紧度不足','调整张紧轮','2024-08-03');
INSERT INTO `crpm_ea3a1a_cdfd45` (`xjsbmc`,`xjry`,`xjrq`,`xjjg`,`ycms`,`clcs`,`xcxjrq`) VALUES ('搅拌机','周琳','2024-08-02','合格','','','2024-08-03');
INSERT INTO `crpm_ea3a1a_cdfd45` (`xjsbmc`,`xjry`,`xjrq`,`xjjg`,`ycms`,`clcs`,`xcxjrq`) VALUES ('真空泵','吴伟','2024-08-02','合格','','','2024-08-03');
INSERT INTO `crpm_ea3a1a_cdfd45` (`xjsbmc`,`xjry`,`xjrq`,`xjjg`,`ycms`,`clcs`,`xcxjrq`) VALUES ('切割机','郑浩','2024-08-02','不合格','切割精度下降','校准导轨','2024-08-03');
INSERT INTO `crpm_ea3a1a_cdfd45` (`xjsbmc`,`xjry`,`xjrq`,`xjjg`,`ycms`,`clcs`,`xcxjrq`) VALUES ('风机','孙丽','2024-08-02','合格','','','2024-08-03');
INSERT INTO `crpm_ea3a1a_cdfd45` (`xjsbmc`,`xjry`,`xjrq`,`xjjg`,`ycms`,`clcs`,`xcxjrq`) VALUES ('包装机','林凯','2024-08-02','合格','','','2024-08-03');
INSERT INTO `crpm_ea3a1a_cdfd45` (`xjsbmc`,`xjry`,`xjrq`,`xjjg`,`ycms`,`clcs`,`xcxjrq`) VALUES ('注塑机','张明','2024-08-03','合格','','','2024-08-04');
INSERT INTO `crpm_ea3a1a_cdfd45` (`xjsbmc`,`xjry`,`xjrq`,`xjjg`,`ycms`,`clcs`,`xcxjrq`) VALUES ('冷却塔','李华','2024-08-03','合格','','','2024-08-04');
INSERT INTO `crpm_ea3a1a_cdfd45` (`xjsbmc`,`xjry`,`xjrq`,`xjjg`,`ycms`,`clcs`,`xcxjrq`) VALUES ('压缩机','王强','2024-08-03','不合格','排气温度偏高','清洗冷却器','2024-08-04');
INSERT INTO `crpm_ea3a1a_cdfd45` (`xjsbmc`,`xjry`,`xjrq`,`xjjg`,`ycms`,`clcs`,`xcxjrq`) VALUES ('烘干机','赵芳','2024-08-03','合格','','','2024-08-04');
INSERT INTO `crpm_ea3a1a_cdfd45` (`xjsbmc`,`xjry`,`xjrq`,`xjjg`,`ycms`,`clcs`,`xcxjrq`) VALUES ('传送带','陈杰','2024-08-03','合格','','','2024-08-04');
INSERT INTO `crpm_ea3a1a_cdfd45` (`xjsbmc`,`xjry`,`xjrq`,`xjjg`,`ycms`,`clcs`,`xcxjrq`) VALUES ('搅拌机','周琳','2024-08-03','不合格','电机温度偏高','检查散热风扇','2024-08-04');
INSERT INTO `crpm_ea3a1a_cdfd45` (`xjsbmc`,`xjry`,`xjrq`,`xjjg`,`ycms`,`clcs`,`xcxjrq`) VALUES ('真空泵','吴伟','2024-08-03','合格','','','2024-08-04');
INSERT INTO `crpm_ea3a1a_cdfd45` (`xjsbmc`,`xjry`,`xjrq`,`xjjg`,`ycms`,`clcs`,`xcxjrq`) VALUES ('切割机','郑浩','2024-08-03','合格','','','2024-08-04');
INSERT INTO `crpm_ea3a1a_cdfd45` (`xjsbmc`,`xjry`,`xjrq`,`xjjg`,`ycms`,`clcs`,`xcxjrq`) VALUES ('风机','孙丽','2024-08-03','不合格','轴承温度偏高','添加润滑油','2024-08-04');
INSERT INTO `crpm_ea3a1a_cdfd45` (`xjsbmc`,`xjry`,`xjrq`,`xjjg`,`ycms`,`clcs`,`xcxjrq`) VALUES ('包装机','林凯','2024-08-03','合格','','','2024-08-04');
INSERT INTO `crpm_ea3a1a_cdfd45` (`xjsbmc`,`xjry`,`xjrq`,`xjjg`,`ycms`,`clcs`,`xcxjrq`) VALUES ('注塑机','张明','2024-08-01','合格','','','2024-08-02');
INSERT INTO `crpm_ea3a1a_cdfd45` (`xjsbmc`,`xjry`,`xjrq`,`xjjg`,`ycms`,`clcs`,`xcxjrq`) VALUES ('冷却塔','李华','2024-08-01','合格','','','2024-08-02');
INSERT INTO `crpm_ea3a1a_cdfd45` (`xjsbmc`,`xjry`,`xjrq`,`xjjg`,`ycms`,`clcs`,`xcxjrq`) VALUES ('压缩机','王强','2024-08-01','合格','','','2024-08-02');
INSERT INTO `crpm_ea3a1a_cdfd45` (`xjsbmc`,`xjry`,`xjrq`,`xjjg`,`ycms`,`clcs`,`xcxjrq`) VALUES ('烘干机','赵芳','2024-08-01','合格','','','2024-08-02');
INSERT INTO `crpm_ea3a1a_cdfd45` (`xjsbmc`,`xjry`,`xjrq`,`xjjg`,`ycms`,`clcs`,`xcxjrq`) VALUES ('传送带','陈杰','2024-08-01','合格','','','2024-08-02');
INSERT INTO `crpm_ea3a1a_cdfd45` (`xjsbmc`,`xjry`,`xjrq`,`xjjg`,`ycms`,`clcs`,`xcxjrq`) VALUES ('搅拌机','周琳','2024-08-01','合格','','','2024-08-02');
INSERT INTO `crpm_ea3a1a_cdfd45` (`xjsbmc`,`xjry`,`xjrq`,`xjjg`,`ycms`,`clcs`,`xcxjrq`) VALUES ('真空泵','吴伟','2024-08-01','合格','','','2024-08-02');
INSERT INTO `crpm_ea3a1a_cdfd45` (`xjsbmc`,`xjry`,`xjrq`,`xjjg`,`ycms`,`clcs`,`xcxjrq`) VALUES ('切割机','郑浩','2024-08-01','合格','','','2024-08-02');
INSERT INTO `crpm_ea3a1a_cdfd45` (`xjsbmc`,`xjry`,`xjrq`,`xjjg`,`ycms`,`clcs`,`xcxjrq`) VALUES ('风机','孙丽','2024-08-01','合格','','','2024-08-02');
INSERT INTO `crpm_ea3a1a_cdfd45` (`xjsbmc`,`xjry`,`xjrq`,`xjjg`,`ycms`,`clcs`,`xcxjrq`) VALUES ('包装机','林凯','2024-08-01','合格','','','2024-08-02');
INSERT INTO `crpm_ea3a1a_cdfd45` (`xjsbmc`,`xjry`,`xjrq`,`xjjg`,`ycms`,`clcs`,`xcxjrq`) VALUES ('注塑机','张明','2024-08-02','合格','','','2024-08-03');
INSERT INTO `crpm_ea3a1a_cdfd45` (`xjsbmc`,`xjry`,`xjrq`,`xjjg`,`ycms`,`clcs`,`xcxjrq`) VALUES ('冷却塔','李华','2024-08-02','不合格','风机振动偏大','调整风机平衡','2024-08-03');
INSERT INTO `crpm_ea3a1a_cdfd45` (`xjsbmc`,`xjry`,`xjrq`,`xjjg`,`ycms`,`clcs`,`xcxjrq`) VALUES ('压缩机','王强','2024-08-02','合格','','','2024-08-03');
INSERT INTO `crpm_ea3a1a_cdfd45` (`xjsbmc`,`xjry`,`xjrq`,`xjjg`,`ycms`,`clcs`,`xcxjrq`) VALUES ('烘干机','赵芳','2024-08-02','合格','','','2024-08-03');
INSERT INTO `crpm_ea3a1a_cdfd45` (`xjsbmc`,`xjry`,`xjrq`,`xjjg`,`ycms`,`clcs`,`xcxjrq`) VALUES ('传送带','陈杰','2024-08-02','不合格','皮带张紧度不足','调整张紧轮','2024-08-03');
INSERT INTO `crpm_ea3a1a_cdfd45` (`xjsbmc`,`xjry`,`xjrq`,`xjjg`,`ycms`,`clcs`,`xcxjrq`) VALUES ('搅拌机','周琳','2024-08-02','合格','','','2024-08-03');
INSERT INTO `crpm_ea3a1a_cdfd45` (`xjsbmc`,`xjry`,`xjrq`,`xjjg`,`ycms`,`clcs`,`xcxjrq`) VALUES ('真空泵','吴伟','2024-08-02','合格','','','2024-08-03');
INSERT INTO `crpm_ea3a1a_cdfd45` (`xjsbmc`,`xjry`,`xjrq`,`xjjg`,`ycms`,`clcs`,`xcxjrq`) VALUES ('切割机','郑浩','2024-08-02','不合格','切割精度下降','校准导轨','2024-08-03');
INSERT INTO `crpm_ea3a1a_cdfd45` (`xjsbmc`,`xjry`,`xjrq`,`xjjg`,`ycms`,`clcs`,`xcxjrq`) VALUES ('风机','孙丽','2024-08-02','合格','','','2024-08-03');
INSERT INTO `crpm_ea3a1a_cdfd45` (`xjsbmc`,`xjry`,`xjrq`,`xjjg`,`ycms`,`clcs`,`xcxjrq`) VALUES ('包装机','林凯','2024-08-02','合格','','','2024-08-03');
INSERT INTO `crpm_ea3a1a_cdfd45` (`xjsbmc`,`xjry`,`xjrq`,`xjjg`,`ycms`,`clcs`,`xcxjrq`) VALUES ('注塑机','张明','2024-08-03','合格','','','2024-08-04');
INSERT INTO `crpm_ea3a1a_cdfd45` (`xjsbmc`,`xjry`,`xjrq`,`xjjg`,`ycms`,`clcs`,`xcxjrq`) VALUES ('冷却塔','李华','2024-08-03','合格','','','2024-08-04');
INSERT INTO `crpm_ea3a1a_cdfd45` (`xjsbmc`,`xjry`,`xjrq`,`xjjg`,`ycms`,`clcs`,`xcxjrq`) VALUES ('压缩机','王强','2024-08-03','不合格','排气温度偏高','清洗冷却器','2024-08-04');
INSERT INTO `crpm_ea3a1a_cdfd45` (`xjsbmc`,`xjry`,`xjrq`,`xjjg`,`ycms`,`clcs`,`xcxjrq`) VALUES ('烘干机','赵芳','2024-08-03','合格','','','2024-08-04');
INSERT INTO `crpm_ea3a1a_cdfd45` (`xjsbmc`,`xjry`,`xjrq`,`xjjg`,`ycms`,`clcs`,`xcxjrq`) VALUES ('传送带','陈杰','2024-08-03','合格','','','2024-08-04');
INSERT INTO `crpm_ea3a1a_cdfd45` (`xjsbmc`,`xjry`,`xjrq`,`xjjg`,`ycms`,`clcs`,`xcxjrq`) VALUES ('搅拌机','周琳','2024-08-03','不合格','电机温度偏高','检查散热风扇','2024-08-04');
INSERT INTO `crpm_ea3a1a_cdfd45` (`xjsbmc`,`xjry`,`xjrq`,`xjjg`,`ycms`,`clcs`,`xcxjrq`) VALUES ('真空泵','吴伟','2024-08-03','合格','','','2024-08-04');
INSERT INTO `crpm_ea3a1a_cdfd45` (`xjsbmc`,`xjry`,`xjrq`,`xjjg`,`ycms`,`clcs`,`xcxjrq`) VALUES ('切割机','郑浩','2024-08-03','合格','','','2024-08-04');
INSERT INTO `crpm_ea3a1a_cdfd45` (`xjsbmc`,`xjry`,`xjrq`,`xjjg`,`ycms`,`clcs`,`xcxjrq`) VALUES ('风机','孙丽','2024-08-03','不合格','轴承温度偏高','添加润滑油','2024-08-04');
INSERT INTO `crpm_ea3a1a_cdfd45` (`xjsbmc`,`xjry`,`xjrq`,`xjjg`,`ycms`,`clcs`,`xcxjrq`) VALUES ('包装机','林凯','2024-08-03','合格','','','2024-08-04');