INSERT INTO `crpm_bf21f2_ffb5c7` (`ddbh`,`khmc`,`cpmc`,`sl`,`dj`,`zj`,`xdsj`,`yjfhsj`,`sjfhsj`,`ddzt`) VALUES ('ORD-202405001','华为技术有限公司','服务器机柜','50','2600','130000','2024-05-05 09:30:00','2024-05-10 17:00:00','2024-05-09 14:30:00','已完成');
INSERT INTO `crpm_bf21f2_ffb5c7` (`ddbh`,`khmc`,`cpmc`,`sl`,`dj`,`zj`,`xdsj`,`yjfhsj`,`sjfhsj`,`ddzt`) VALUES ('ORD-202405002','阿里巴巴集团','千兆交换机','80','1850','148000','2024-05-10 14:15:00','2024-05-15 16:30:00','2024-05-15 16:30:00','已完成');
INSERT INTO `crpm_bf21f2_ffb5c7` (`ddbh`,`khmc`,`cpmc`,`sl`,`dj`,`zj`,`xdsj`,`yjfhsj`,`sjfhsj`,`ddzt`) VALUES ('ORD-202405003','腾讯科技有限公司','企业级硬盘','120','1750','210000','2024-05-15 10:00:00','2024-05-20 17:00:00','2024-05-22 09:00:00','已完成');
INSERT INTO `crpm_bf21f2_ffb5c7` (`ddbh`,`khmc`,`cpmc`,`sl`,`dj`,`zj`,`xdsj`,`yjfhsj`,`sjfhsj`,`ddzt`) VALUES ('ORD-202405004','百度在线网络技术','服务器内存','200','820','164000','2024-05-20 13:30:00','2024-05-25 16:00:00','2024-05-28 11:30:00','已完成');
INSERT INTO `crpm_bf21f2_ffb5c7` (`ddbh`,`khmc`,`cpmc`,`sl`,`dj`,`zj`,`xdsj`,`yjfhsj`,`sjfhsj`,`ddzt`) VALUES ('ORD-202405005','京东集团','防火墙设备','30','23500','705000','2024-05-25 09:15:00','2024-05-30 17:30:00','2024-05-30 17:30:00','已完成');
INSERT INTO `crpm_bf21f2_ffb5c7` (`ddbh`,`khmc`,`cpmc`,`sl`,`dj`,`zj`,`xdsj`,`yjfhsj`,`sjfhsj`,`ddzt`) VALUES ('ORD-202406001','字节跳动有限公司','无线AP','150','1120','168000','2024-06-05 10:00:00','2024-06-10 16:30:00','2024-06-10 16:30:00','已完成');
INSERT INTO `crpm_bf21f2_ffb5c7` (`ddbh`,`khmc`,`cpmc`,`sl`,`dj`,`zj`,`xdsj`,`yjfhsj`,`sjfhsj`,`ddzt`) VALUES ('ORD-202406002','美团科技有限公司','PDU电源','80','1250','100000','2024-06-10 14:30:00','2024-06-15 17:00:00','2024-06-15 17:00:00','已完成');
INSERT INTO `crpm_bf21f2_ffb5c7` (`ddbh`,`khmc`,`cpmc`,`sl`,`dj`,`zj`,`xdsj`,`yjfhsj`,`sjfhsj`,`ddzt`) VALUES ('ORD-202406003','网易（杭州）网络','KVM切换器','40','2300','92000','2024-06-15 09:30:00','2024-06-20 16:30:00','2024-06-22 10:00:00','已完成');
INSERT INTO `crpm_bf21f2_ffb5c7` (`ddbh`,`khmc`,`cpmc`,`sl`,`dj`,`zj`,`xdsj`,`yjfhsj`,`sjfhsj`,`ddzt`) VALUES ('ORD-202406004','小米科技有限责任公司','工业路由器','60','3200','192000','2024-06-20 13:15:00','2024-06-25 17:00:00','2024-06-25 17:00:00','已完成');
INSERT INTO `crpm_bf21f2_ffb5c7` (`ddbh`,`khmc`,`cpmc`,`sl`,`dj`,`zj`,`xdsj`,`yjfhsj`,`sjfhsj`,`ddzt`) VALUES ('ORD-202406005','360科技集团','UPS电源','20','6800','136000','2024-06-25 10:00:00','2024-06-30 16:30:00','2024-06-30 16:30:00','已完成');