INSERT INTO `crpm_49a150_7d8595` (`cpmc`,`scpch`,`jhcl`,`sjcl`,`ksscsj`,`jsscsj`,`scxbh`,`scfzr`,`cphgl`,`cpfgl`,`bzxx`) VALUES ('智能控制器','PC-202407001','1000','1020','2024-07-01 08:00:00','2024-07-05 17:00:00','L1','王工','98.5%','1.5%','提前完成');
INSERT INTO `crpm_49a150_7d8595` (`cpmc`,`scpch`,`jhcl`,`sjcl`,`ksscsj`,`jsscsj`,`scxbh`,`scfzr`,`cphgl`,`cpfgl`,`bzxx`) VALUES ('工业传感器','PC-202407002','800','790','2024-07-03 09:30:00','2024-07-08 16:30:00','L2','李工','97.2%','2.8%','原料延迟1天');
INSERT INTO `crpm_49a150_7d8595` (`cpmc`,`scpch`,`jhcl`,`sjcl`,`ksscsj`,`jsscsj`,`scxbh`,`scfzr`,`cphgl`,`cpfgl`,`bzxx`) VALUES ('精密齿轮箱','PC-202407003','500','510','2024-07-05 08:30:00','2024-07-12 17:30:00','L3','张工','99.1%','0.9%','工艺优化');
INSERT INTO `crpm_49a150_7d8595` (`cpmc`,`scpch`,`jhcl`,`sjcl`,`ksscsj`,`jsscsj`,`scxbh`,`scfzr`,`cphgl`,`cpfgl`,`bzxx`) VALUES ('锂电池组','PC-202407004','1200','1180','2024-07-08 10:00:00','2024-07-15 16:00:00','L4','赵工','96.8%','3.2%','设备维护半天');
INSERT INTO `crpm_49a150_7d8595` (`cpmc`,`scpch`,`jhcl`,`sjcl`,`ksscsj`,`jsscsj`,`scxbh`,`scfzr`,`cphgl`,`cpfgl`,`bzxx`) VALUES ('伺服电机','PC-202407005','600','615','2024-07-10 08:00:00','2024-07-16 17:00:00','L1','王工','98.9%','1.1%','合格率提升');
INSERT INTO `crpm_49a150_7d8595` (`cpmc`,`scpch`,`jhcl`,`sjcl`,`ksscsj`,`jsscsj`,`scxbh`,`scfzr`,`cphgl`,`cpfgl`,`bzxx`) VALUES ('PLC控制器','PC-202407006','900','890','2024-07-12 09:00:00','2024-07-19 16:00:00','L2','李工','97.5%','2.5%','夏季高温影响');
INSERT INTO `crpm_49a150_7d8595` (`cpmc`,`scpch`,`jhcl`,`sjcl`,`ksscsj`,`jsscsj`,`scxbh`,`scfzr`,`cphgl`,`cpfgl`,`bzxx`) VALUES ('液压泵','PC-202407007','400','405','2024-07-15 08:30:00','2024-07-22 17:30:00','L3','张工','99.3%','0.7%','质检标准提高');
INSERT INTO `crpm_49a150_7d8595` (`cpmc`,`scpch`,`jhcl`,`sjcl`,`ksscsj`,`jsscsj`,`scxbh`,`scfzr`,`cphgl`,`cpfgl`,`bzxx`) VALUES ('工业机器人','PC-202407008','200','200','2024-07-18 10:00:00','2024-07-28 16:00:00','L4','赵工','98.2%','1.8%','按计划完成');
INSERT INTO `crpm_49a150_7d8595` (`cpmc`,`scpch`,`jhcl`,`sjcl`,`ksscsj`,`jsscsj`,`scxbh`,`scfzr`,`cphgl`,`cpfgl`,`bzxx`) VALUES ('智能仪表','PC-202408009','1100','1120','2024-08-01 08:00:00','2024-08-07 17:00:00','L1','王工','98.7%','1.3%','人员熟练度提升');
INSERT INTO `crpm_49a150_7d8595` (`cpmc`,`scpch`,`jhcl`,`sjcl`,`ksscsj`,`jsscsj`,`scxbh`,`scfzr`,`cphgl`,`cpfgl`,`bzxx`) VALUES ('自动化模块','PC-202408010','700','690','2024-08-03 09:30:00','2024-08-10 16:30:00','L2','李工','97.8%','2.2%','部分原料更换供应商');