INSERT INTO `crpm_bf21f2_8f2862` (`zljcxm`,`zlbz`,`jcff`,`jcjg`,`clcs`,`fzr`,`jcrq`,`bz`) VALUES ('外观尺寸','±0.5mm','三坐标测量仪','合格','正常入库','李工','2024-05-05','抽检5件');
INSERT INTO `crpm_bf21f2_8f2862` (`zljcxm`,`zlbz`,`jcff`,`jcjg`,`clcs`,`fzr`,`jcrq`,`bz`) VALUES ('化学成分','C≤0.25%, Si≤0.50%','光谱分析仪','合格','正常入库','王工','2024-05-10','批次号A20240501');
INSERT INTO `crpm_bf21f2_8f2862` (`zljcxm`,`zlbz`,`jcff`,`jcjg`,`clcs`,`fzr`,`jcrq`,`bz`) VALUES ('硬度测试','HRC 45-50','洛氏硬度计','不合格','返厂热处理','张工','2024-05-15','3件不合格');
INSERT INTO `crpm_bf21f2_8f2862` (`zljcxm`,`zlbz`,`jcff`,`jcjg`,`clcs`,`fzr`,`jcrq`,`bz`) VALUES ('密封性','≤0.01MPa/min','气密检测仪','合格','正常入库','刘工','2024-05-20','压力保持5分钟');
INSERT INTO `crpm_bf21f2_8f2862` (`zljcxm`,`zlbz`,`jcff`,`jcjg`,`clcs`,`fzr`,`jcrq`,`bz`) VALUES ('材料强度','≥500MPa','万能材料试验机','合格','正常入库','赵工','2024-05-25','取样位置符合标准');
INSERT INTO `crpm_bf21f2_8f2862` (`zljcxm`,`zlbz`,`jcff`,`jcjg`,`clcs`,`fzr`,`jcrq`,`bz`) VALUES ('表面粗糙度','Ra≤1.6μm','粗糙度仪','不合格','重新打磨','孙工','2024-05-30','7件需返工');
INSERT INTO `crpm_bf21f2_8f2862` (`zljcxm`,`zlbz`,`jcff`,`jcjg`,`clcs`,`fzr`,`jcrq`,`bz`) VALUES ('耐腐蚀性','≥1000h盐雾试验','盐雾试验箱','合格','正常入库','周工','2024-06-05','中性盐雾');
INSERT INTO `crpm_bf21f2_8f2862` (`zljcxm`,`zlbz`,`jcff`,`jcjg`,`clcs`,`fzr`,`jcrq`,`bz`) VALUES ('电气性能','绝缘电阻≥10MΩ','绝缘电阻测试仪','合格','正常入库','吴工','2024-06-10','测试电压500V');
INSERT INTO `crpm_bf21f2_8f2862` (`zljcxm`,`zlbz`,`jcff`,`jcjg`,`clcs`,`fzr`,`jcrq`,`bz`) VALUES ('装配性能','无干涉装配','实际装配测试','不合格','调整公差','郑工','2024-06-15','2处装配困难');
INSERT INTO `crpm_bf21f2_8f2862` (`zljcxm`,`zlbz`,`jcff`,`jcjg`,`clcs`,`fzr`,`jcrq`,`bz`) VALUES ('尺寸稳定性','±0.02mm/年','激光测量仪','合格','正常入库','钱工','2024-06-20','模拟老化测试');