INSERT INTO `crpm_bf21f2_ed5ca5` (`wlbm`,`wlmc`,`ggxh`,`dw`,`xql`,`kcl`,`cgl`,`gys`,`cgjg`,`cgzq`,`yjdhrq`,`zdkcl`,`aqkcl`) VALUES ('WL-20240501','螺纹钢','HRB400E Φ12','吨','50','32','20','上海宝钢集团','4200','15天','2024-05-15','10','20');
INSERT INTO `crpm_bf21f2_ed5ca5` (`wlbm`,`wlmc`,`ggxh`,`dw`,`xql`,`kcl`,`cgl`,`gys`,`cgjg`,`cgzq`,`yjdhrq`,`zdkcl`,`aqkcl`) VALUES ('WL-20240502','水泥','PO 42.5R','袋','200','150','100','海螺水泥股份有限公司','380','7天','2024-05-20','50','80');
INSERT INTO `crpm_bf21f2_ed5ca5` (`wlbm`,`wlmc`,`ggxh`,`dw`,`xql`,`kcl`,`cgl`,`gys`,`cgjg`,`cgzq`,`yjdhrq`,`zdkcl`,`aqkcl`) VALUES ('WL-20240503','电缆','YJV-0.6/1kV-3×120+1×70','米','800','450','500','远东电缆有限公司','280','10天','2024-05-25','200','300');
INSERT INTO `crpm_bf21f2_ed5ca5` (`wlbm`,`wlmc`,`ggxh`,`dw`,`xql`,`kcl`,`cgl`,`gys`,`cgjg`,`cgzq`,`yjdhrq`,`zdkcl`,`aqkcl`) VALUES ('WL-20240504','配电箱','XL-21','台','15','8','10','施耐德电气有限公司','3500','20天','2024-06-02','5','10');
INSERT INTO `crpm_bf21f2_ed5ca5` (`wlbm`,`wlmc`,`ggxh`,`dw`,`xql`,`kcl`,`cgl`,`gys`,`cgjg`,`cgzq`,`yjdhrq`,`zdkcl`,`aqkcl`) VALUES ('WL-20240505','混凝土','C30','立方米','120','30','80','中建商品混凝土有限公司','450','3天','2024-05-10','20','40');
INSERT INTO `crpm_bf21f2_ed5ca5` (`wlbm`,`wlmc`,`ggxh`,`dw`,`xql`,`kcl`,`cgl`,`gys`,`cgjg`,`cgzq`,`yjdhrq`,`zdkcl`,`aqkcl`) VALUES ('WL-20240506','木材','红松 40×60×4000','立方米','30','12','15','吉林森工集团','1800','12天','2024-05-28','5','10');
INSERT INTO `crpm_bf21f2_ed5ca5` (`wlbm`,`wlmc`,`ggxh`,`dw`,`xql`,`kcl`,`cgl`,`gys`,`cgjg`,`cgzq`,`yjdhrq`,`zdkcl`,`aqkcl`) VALUES ('WL-20240507','钢管','Φ108×4.5','米','200','80','100','天津友发钢管集团','5200','15天','2024-06-05','50','100');
INSERT INTO `crpm_bf21f2_ed5ca5` (`wlbm`,`wlmc`,`ggxh`,`dw`,`xql`,`kcl`,`cgl`,`gys`,`cgjg`,`cgzq`,`yjdhrq`,`zdkcl`,`aqkcl`) VALUES ('WL-20240508','电线','BV-2.5mm²','卷','50','25','30','正泰电气股份有限公司','260','7天','2024-05-18','10','20');
INSERT INTO `crpm_bf21f2_ed5ca5` (`wlbm`,`wlmc`,`ggxh`,`dw`,`xql`,`kcl`,`cgl`,`gys`,`cgjg`,`cgzq`,`yjdhrq`,`zdkcl`,`aqkcl`) VALUES ('WL-20240509','瓷砖','800×800 通体砖','片','500','200','300','马可波罗瓷砖有限公司','85','10天','2024-06-08','100','150');
INSERT INTO `crpm_bf21f2_ed5ca5` (`wlbm`,`wlmc`,`ggxh`,`dw`,`xql`,`kcl`,`cgl`,`gys`,`cgjg`,`cgzq`,`yjdhrq`,`zdkcl`,`aqkcl`) VALUES ('WL-20240510','玻璃','5mm 钢化玻璃','平方米','120','40','80','福耀玻璃工业集团','120','15天','2024-06-12','20','30');
INSERT INTO `crpm_bf21f2_ed5ca5` (`wlbm`,`wlmc`,`ggxh`,`dw`,`xql`,`kcl`,`cgl`,`gys`,`cgjg`,`cgzq`,`yjdhrq`,`zdkcl`,`aqkcl`) VALUES ('M202405001','高强度螺栓','M20×80','套','1500','800','1000','上海高强度螺栓厂','12.5','10天','2024-05-18','500','800');
INSERT INTO `crpm_bf21f2_ed5ca5` (`wlbm`,`wlmc`,`ggxh`,`dw`,`xql`,`kcl`,`cgl`,`gys`,`cgjg`,`cgzq`,`yjdhrq`,`zdkcl`,`aqkcl`) VALUES ('M202405002','电动葫芦','CD1-5T-9M','台','5','2','3','河南矿山起重机有限公司','18500','15天','2024-05-25','1','2');
INSERT INTO `crpm_bf21f2_ed5ca5` (`wlbm`,`wlmc`,`ggxh`,`dw`,`xql`,`kcl`,`cgl`,`gys`,`cgjg`,`cgzq`,`yjdhrq`,`zdkcl`,`aqkcl`) VALUES ('M202405003','聚氯乙烯电缆','VV22-1kV-4×70','米','3000','1200','2000','江苏上上电缆集团','86.5','12天','2024-05-22','800','1500');
INSERT INTO `crpm_bf21f2_ed5ca5` (`wlbm`,`wlmc`,`ggxh`,`dw`,`xql`,`kcl`,`cgl`,`gys`,`cgjg`,`cgzq`,`yjdhrq`,`zdkcl`,`aqkcl`) VALUES ('M202405004','离心泵','ISW80-160','台','3','1','2','上海凯泉泵业集团','4200','20天','2024-06-05','1','2');
INSERT INTO `crpm_bf21f2_ed5ca5` (`wlbm`,`wlmc`,`ggxh`,`dw`,`xql`,`kcl`,`cgl`,`gys`,`cgjg`,`cgzq`,`yjdhrq`,`zdkcl`,`aqkcl`) VALUES ('M202405005','热轧钢板','Q235B 10mm','吨','25','8','15','武汉钢铁集团','4580','15天','2024-05-30','5','10');
INSERT INTO `crpm_bf21f2_ed5ca5` (`wlbm`,`wlmc`,`ggxh`,`dw`,`xql`,`kcl`,`cgl`,`gys`,`cgjg`,`cgzq`,`yjdhrq`,`zdkcl`,`aqkcl`) VALUES ('M202405006','橡胶密封圈','DN100','个','200','80','120','浙江三力士橡胶股份','18.5','7天','2024-05-15','50','100');
INSERT INTO `crpm_bf21f2_ed5ca5` (`wlbm`,`wlmc`,`ggxh`,`dw`,`xql`,`kcl`,`cgl`,`gys`,`cgjg`,`cgzq`,`yjdhrq`,`zdkcl`,`aqkcl`) VALUES ('M202405007','智能电表','DTSD1352','台','50','15','30','深圳科陆电子科技','320','10天','2024-05-20','10','20');
INSERT INTO `crpm_bf21f2_ed5ca5` (`wlbm`,`wlmc`,`ggxh`,`dw`,`xql`,`kcl`,`cgl`,`gys`,`cgjg`,`cgzq`,`yjdhrq`,`zdkcl`,`aqkcl`) VALUES ('M202405008','无缝钢管','Φ159×6','米','180','60','100','包头钢铁集团','62.5','15天','2024-06-02','30','50');
INSERT INTO `crpm_bf21f2_ed5ca5` (`wlbm`,`wlmc`,`ggxh`,`dw`,`xql`,`kcl`,`cgl`,`gys`,`cgjg`,`cgzq`,`yjdhrq`,`zdkcl`,`aqkcl`) VALUES ('M202405009','工业轴承','6208-2RS','套','120','40','80','洛阳LYC轴承有限公司','78','12天','2024-05-28','20','50');
INSERT INTO `crpm_bf21f2_ed5ca5` (`wlbm`,`wlmc`,`ggxh`,`dw`,`xql`,`kcl`,`cgl`,`gys`,`cgjg`,`cgzq`,`yjdhrq`,`zdkcl`,`aqkcl`) VALUES ('M202405010','消防栓','SS100/65-1.6','套','20','8','15','福建天广消防有限公司','860','15天','2024-06-10','5','10');