INSERT INTO `crpm_596455_c386d2` (`fssj`,`fszt`,`jsfsjhm`,`dxmb_i_d`,`dxnr`,`dxqm`,`dxhzzt`) VALUES ('2024-02-05 10:00:00','成功','13800138001','TPL001','【生产通知】您有新的生产计划需要处理，请登录系统查看。','生产通知','已送达');
INSERT INTO `crpm_596455_c386d2` (`fssj`,`fszt`,`jsfsjhm`,`dxmb_i_d`,`dxnr`,`dxqm`,`dxhzzt`) VALUES ('2024-02-10 15:30:00','成功','13900139002','TPL002','【设备提醒】设备ID:1001将于2024-02-15进行例行维护。','设备提醒','已送达');
INSERT INTO `crpm_596455_c386d2` (`fssj`,`fszt`,`jsfsjhm`,`dxmb_i_d`,`dxnr`,`dxqm`,`dxhzzt`) VALUES ('2024-02-15 09:45:00','成功','13700137003','TPL003','【质量通知】您提交的检测单QC2024001结果为合格。','质量通知','已送达');
INSERT INTO `crpm_596455_c386d2` (`fssj`,`fszt`,`jsfsjhm`,`dxmb_i_d`,`dxnr`,`dxqm`,`dxhzzt`) VALUES ('2024-02-20 14:15:00','成功','13600136004','TPL004','【采购提醒】您采购的原材料A已到货，请安排验收。','采购提醒','已送达');
INSERT INTO `crpm_596455_c386d2` (`fssj`,`fszt`,`jsfsjhm`,`dxmb_i_d`,`dxnr`,`dxqm`,`dxhzzt`) VALUES ('2024-02-25 11:30:00','成功','13500135005','TPL005','【库存通知】原材料B当前库存50件，低于预警线100件。','库存通知','已送达');
INSERT INTO `crpm_596455_c386d2` (`fssj`,`fszt`,`jsfsjhm`,`dxmb_i_d`,`dxnr`,`dxqm`,`dxhzzt`) VALUES ('2024-03-01 16:00:00','成功','13400134006','TPL006','【研发通知】项目X的需求分析节点进度为80%。','研发通知','已送达');
INSERT INTO `crpm_596455_c386d2` (`fssj`,`fszt`,`jsfsjhm`,`dxmb_i_d`,`dxnr`,`dxqm`,`dxhzzt`) VALUES ('2024-03-05 10:15:00','成功','13300133007','TPL007','【人事通知】将于2024-03-10 09:00在3楼会议室进行安全生产培训。','人事通知','已送达');
INSERT INTO `crpm_596455_c386d2` (`fssj`,`fszt`,`jsfsjhm`,`dxmb_i_d`,`dxnr`,`dxqm`,`dxhzzt`) VALUES ('2024-03-10 15:45:00','成功','13200132008','TPL008','【财务提醒】您的报销申请F2024001已通过审批。','财务提醒','已送达');
INSERT INTO `crpm_596455_c386d2` (`fssj`,`fszt`,`jsfsjhm`,`dxmb_i_d`,`dxnr`,`dxqm`,`dxhzzt`) VALUES ('2024-03-15 09:30:00','失败','13100131009','TPL009','【安全通知】计划于2024-03-20 15:00进行消防演练，请做好准备。','安全通知','发送失败');
INSERT INTO `crpm_596455_c386d2` (`fssj`,`fszt`,`jsfsjhm`,`dxmb_i_d`,`dxnr`,`dxqm`,`dxhzzt`) VALUES ('2024-03-20 14:00:00','成功','13000130010','TPL010','【系统通知】系统将于2024-03-25 22:00进行升级维护，预计2小时。','系统通知','已送达');