INSERT INTO `crpm_596455_feaf2a` (`fszxm`,`sjhm`,`dxnr`,`fssj`,`ztm`,`cwm`,`bz`) VALUES ('系统管理员','13800138001','【生产通知】您有新的生产计划需要处理。','2024-02-05 10:00:00','0000','','正常发送');
INSERT INTO `crpm_596455_feaf2a` (`fszxm`,`sjhm`,`dxnr`,`fssj`,`ztm`,`cwm`,`bz`) VALUES ('设备工程师','13900139002','【设备提醒】设备1001需要维护。','2024-02-10 15:30:00','0000','','正常发送');
INSERT INTO `crpm_596455_feaf2a` (`fszxm`,`sjhm`,`dxnr`,`fssj`,`ztm`,`cwm`,`bz`) VALUES ('质检员','13700137003','【质量通知】检测单QC2024001已完成。','2024-02-15 09:45:00','0000','','正常发送');
INSERT INTO `crpm_596455_feaf2a` (`fszxm`,`sjhm`,`dxnr`,`fssj`,`ztm`,`cwm`,`bz`) VALUES ('采购员','13600136004','【采购提醒】原材料A已到货。','2024-02-20 14:15:00','0000','','正常发送');
INSERT INTO `crpm_596455_feaf2a` (`fszxm`,`sjhm`,`dxnr`,`fssj`,`ztm`,`cwm`,`bz`) VALUES ('库管员','13500135005','【库存通知】原材料B库存不足。','2024-02-25 11:30:00','0000','','正常发送');
INSERT INTO `crpm_596455_feaf2a` (`fszxm`,`sjhm`,`dxnr`,`fssj`,`ztm`,`cwm`,`bz`) VALUES ('研发主管','13400134006','【研发通知】项目X进度正常。','2024-03-01 16:00:00','0000','','正常发送');
INSERT INTO `crpm_596455_feaf2a` (`fszxm`,`sjhm`,`dxnr`,`fssj`,`ztm`,`cwm`,`bz`) VALUES ('人事专员','13300133007','【人事通知】请参加下周培训。','2024-03-05 10:15:00','0000','','正常发送');
INSERT INTO `crpm_596455_feaf2a` (`fszxm`,`sjhm`,`dxnr`,`fssj`,`ztm`,`cwm`,`bz`) VALUES ('财务会计','13200132008','【财务提醒】报销申请已通过。','2024-03-10 15:45:00','0000','','正常发送');
INSERT INTO `crpm_596455_feaf2a` (`fszxm`,`sjhm`,`dxnr`,`fssj`,`ztm`,`cwm`,`bz`) VALUES ('安全主管','13100131009','【安全通知】消防演练安排。','2024-03-15 09:30:00','4001','SMS001','号码不存在');
INSERT INTO `crpm_596455_feaf2a` (`fszxm`,`sjhm`,`dxnr`,`fssj`,`ztm`,`cwm`,`bz`) VALUES ('IT管理员','13000130010','【系统通知】系统将维护。','2024-03-20 14:00:00','4002','SMS002','内容包含敏感词');