CREATE TABLE `crpm_95e998_d052b1` (
`id` BIGINT NOT NULL AUTO_INCREMENT PRIMARY KEY,
`dmpd` varchar(255) DEFAULT NULL COMMENT '代码片段',
`cwxx` varchar(255) DEFAULT NULL COMMENT '错误信息',
`xfjy` varchar(255) DEFAULT NULL COMMENT '修复建议',
`dssj` varchar(255) DEFAULT NULL COMMENT '调试时间',
`dszt` varchar(255) DEFAULT NULL COMMENT '调试状态',
`yh_i_d` varchar(255) DEFAULT NULL COMMENT '用户ID',
`xm_i_d` varchar(255) DEFAULT NULL COMMENT '项目ID'
);