INSERT INTO `crpm_596455_77273b` (`mb_i_d`,`dxqm`,`dxmbnr`,`dxmbbl`,`dxfssj`,`dxzt`) VALUES ('TPL001','生产通知','【生产通知】您有新的生产计划需要处理，请登录系统查看。','无','2024-02-05 10:00:00','成功');
INSERT INTO `crpm_596455_77273b` (`mb_i_d`,`dxqm`,`dxmbnr`,`dxmbbl`,`dxfssj`,`dxzt`) VALUES ('TPL002','设备提醒','【设备提醒】设备ID:1001将于2024-02-15进行例行维护。','设备编号=1001,维护日期=2024-02-15','2024-02-10 15:30:00','成功');
INSERT INTO `crpm_596455_77273b` (`mb_i_d`,`dxqm`,`dxmbnr`,`dxmbbl`,`dxfssj`,`dxzt`) VALUES ('TPL003','质量通知','【质量通知】您提交的检测单QC2024001结果为合格。','检测单号=QC2024001,检测结果=合格','2024-02-15 09:45:00','成功');
INSERT INTO `crpm_596455_77273b` (`mb_i_d`,`dxqm`,`dxmbnr`,`dxmbbl`,`dxfssj`,`dxzt`) VALUES ('TPL004','采购提醒','【采购提醒】您采购的原材料A已到货，请安排验收。','物料名称=原材料A','2024-02-20 14:15:00','成功');
INSERT INTO `crpm_596455_77273b` (`mb_i_d`,`dxqm`,`dxmbnr`,`dxmbbl`,`dxfssj`,`dxzt`) VALUES ('TPL005','库存通知','【库存通知】原材料B当前库存50件，低于预警线100件。','物料名称=原材料B,库存数量=50,预警值=100','2024-02-25 11:30:00','成功');
INSERT INTO `crpm_596455_77273b` (`mb_i_d`,`dxqm`,`dxmbnr`,`dxmbbl`,`dxfssj`,`dxzt`) VALUES ('TPL006','研发通知','【研发通知】项目X的需求分析节点进度为80%。','项目名称=项目X,任务名称=需求分析,进度百分比=80%','2024-03-01 16:00:00','成功');
INSERT INTO `crpm_596455_77273b` (`mb_i_d`,`dxqm`,`dxmbnr`,`dxmbbl`,`dxfssj`,`dxzt`) VALUES ('TPL007','人事通知','【人事通知】将于2024-03-10 09:00在3楼会议室进行安全生产培训。','培训日期=2024-03-10,培训时间=09:00,培训地点=3楼会议室,培训主题=安全生产','2024-03-05 10:15:00','成功');
INSERT INTO `crpm_596455_77273b` (`mb_i_d`,`dxqm`,`dxmbnr`,`dxmbbl`,`dxfssj`,`dxzt`) VALUES ('TPL008','财务提醒','【财务提醒】您的报销申请F2024001已通过审批。','报销单号=F2024001,审批状态=通过审批','2024-03-10 15:45:00','成功');
INSERT INTO `crpm_596455_77273b` (`mb_i_d`,`dxqm`,`dxmbnr`,`dxmbbl`,`dxfssj`,`dxzt`) VALUES ('TPL009','安全通知','【安全通知】计划于2024-03-20 15:00进行消防演练，请做好准备。','演练日期=2024-03-20,演练时间=15:00,演练类型=消防','2024-03-15 09:30:00','失败');
INSERT INTO `crpm_596455_77273b` (`mb_i_d`,`dxqm`,`dxmbnr`,`dxmbbl`,`dxfssj`,`dxzt`) VALUES ('TPL010','系统通知','【系统通知】系统将于2024-03-25 22:00进行升级维护，预计2小时。','维护日期=2024-03-25,维护时间=22:00,维护时长=2小时','2024-03-20 14:00:00','成功');