INSERT INTO `crpm_ea3a1a_17fbb1` (`ewm_i_d`,`sb_i_d`,`xjzt`,`gxsj`,`cjsj`,`bz`) VALUES ('EWM-20240801001','SB-2024001','已完成','2024-08-01 08:30:00','2024-08-01 08:00:00','运行正常，无异常');
INSERT INTO `crpm_ea3a1a_17fbb1` (`ewm_i_d`,`sb_i_d`,`xjzt`,`gxsj`,`cjsj`,`bz`) VALUES ('EWM-20240801002','SB-2024002','已完成','2024-08-01 09:15:00','2024-08-01 08:45:00','振动值略高，建议下周重点关注');
INSERT INTO `crpm_ea3a1a_17fbb1` (`ewm_i_d`,`sb_i_d`,`xjzt`,`gxsj`,`cjsj`,`bz`) VALUES ('EWM-20240801003','SB-2024003','已完成','2024-08-01 10:00:00','2024-08-01 09:30:00','冷却系统需要清洗');
INSERT INTO `crpm_ea3a1a_17fbb1` (`ewm_i_d`,`sb_i_d`,`xjzt`,`gxsj`,`cjsj`,`bz`) VALUES ('EWM-20240801004','SB-2024004','已完成','2024-08-01 10:45:00','2024-08-01 10:15:00','传送带张紧度正常');
INSERT INTO `crpm_ea3a1a_17fbb1` (`ewm_i_d`,`sb_i_d`,`xjzt`,`gxsj`,`cjsj`,`bz`) VALUES ('EWM-20240801005','SB-2024005','已完成','2024-08-01 11:30:00','2024-08-01 11:00:00','电机温度正常，无杂音');
INSERT INTO `crpm_ea3a1a_17fbb1` (`ewm_i_d`,`sb_i_d`,`xjzt`,`gxsj`,`cjsj`,`bz`) VALUES ('EWM-20240802001','SB-2024006','已完成','2024-08-02 08:30:00','2024-08-02 08:00:00','润滑系统正常');
INSERT INTO `crpm_ea3a1a_17fbb1` (`ewm_i_d`,`sb_i_d`,`xjzt`,`gxsj`,`cjsj`,`bz`) VALUES ('EWM-20240802002','SB-2024007','已完成','2024-08-02 09:15:00','2024-08-02 08:45:00','传感器读数稳定');
INSERT INTO `crpm_ea3a1a_17fbb1` (`ewm_i_d`,`sb_i_d`,`xjzt`,`gxsj`,`cjsj`,`bz`) VALUES ('EWM-20240802003','SB-2024008','已完成','2024-08-02 10:00:00','2024-08-02 09:30:00','刀具磨损度正常');
INSERT INTO `crpm_ea3a1a_17fbb1` (`ewm_i_d`,`sb_i_d`,`xjzt`,`gxsj`,`cjsj`,`bz`) VALUES ('EWM-20240802004','SB-2024009','已完成','2024-08-02 10:45:00','2024-08-02 10:15:00','控制系统运行稳定');
INSERT INTO `crpm_ea3a1a_17fbb1` (`ewm_i_d`,`sb_i_d`,`xjzt`,`gxsj`,`cjsj`,`bz`) VALUES ('EWM-20240802005','SB-2024010','已完成','2024-08-02 11:30:00','2024-08-02 11:00:00','气压系统正常，无泄漏');
INSERT INTO `crpm_ea3a1a_17fbb1` (`ewm_i_d`,`sb_i_d`,`xjzt`,`gxsj`,`cjsj`,`bz`) VALUES ('EWM-20240803001','SB-2024011','已完成','2024-08-03 08:30:00','2024-08-03 08:00:00','风机运行平稳');
INSERT INTO `crpm_ea3a1a_17fbb1` (`ewm_i_d`,`sb_i_d`,`xjzt`,`gxsj`,`cjsj`,`bz`) VALUES ('EWM-20240803002','SB-2024012','已完成','2024-08-03 09:15:00','2024-08-03 08:45:00','液压系统压力正常');
INSERT INTO `crpm_ea3a1a_17fbb1` (`ewm_i_d`,`sb_i_d`,`xjzt`,`gxsj`,`cjsj`,`bz`) VALUES ('EWM-20240803003','SB-2024013','已完成','2024-08-03 10:00:00','2024-08-03 09:30:00','链条张紧度正常');
INSERT INTO `crpm_ea3a1a_17fbb1` (`ewm_i_d`,`sb_i_d`,`xjzt`,`gxsj`,`cjsj`,`bz`) VALUES ('EWM-20240803004','SB-2024014','已完成','2024-08-03 10:45:00','2024-08-03 10:15:00','联轴器无松动');
INSERT INTO `crpm_ea3a1a_17fbb1` (`ewm_i_d`,`sb_i_d`,`xjzt`,`gxsj`,`cjsj`,`bz`) VALUES ('EWM-20240803005','SB-2024015','已完成','2024-08-03 11:30:00','2024-08-03 11:00:00','温控系统正常');
INSERT INTO `crpm_ea3a1a_17fbb1` (`ewm_i_d`,`sb_i_d`,`xjzt`,`gxsj`,`cjsj`,`bz`) VALUES ('EWM-20240901001','SB-2024001','已完成','2024-09-01 08:30:00','2024-09-01 08:00:00','更换滤芯，运行正常');
INSERT INTO `crpm_ea3a1a_17fbb1` (`ewm_i_d`,`sb_i_d`,`xjzt`,`gxsj`,`cjsj`,`bz`) VALUES ('EWM-20240901002','SB-2024003','已完成','2024-09-01 09:15:00','2024-09-01 08:45:00','清洗冷却系统，压力稳定');
INSERT INTO `crpm_ea3a1a_17fbb1` (`ewm_i_d`,`sb_i_d`,`xjzt`,`gxsj`,`cjsj`,`bz`) VALUES ('EWM-20240901003','SB-2024005','已完成','2024-09-01 10:00:00','2024-09-01 09:30:00','轴承润滑良好');
INSERT INTO `crpm_ea3a1a_17fbb1` (`ewm_i_d`,`sb_i_d`,`xjzt`,`gxsj`,`cjsj`,`bz`) VALUES ('EWM-20240901004','SB-2024007','已完成','2024-09-01 10:45:00','2024-09-01 10:15:00','校准传感器，读数准确');
INSERT INTO `crpm_ea3a1a_17fbb1` (`ewm_i_d`,`sb_i_d`,`xjzt`,`gxsj`,`cjsj`,`bz`) VALUES ('EWM-20240901005','SB-2024009','已完成','2024-09-01 11:30:00','2024-09-01 11:00:00','更新控制系统程序');
INSERT INTO `crpm_ea3a1a_17fbb1` (`ewm_i_d`,`sb_i_d`,`xjzt`,`gxsj`,`cjsj`,`bz`) VALUES ('EWM-20240801001','SB-2024001','已完成','2024-08-01 08:30:00','2024-08-01 08:00:00','运行正常，无异常');
INSERT INTO `crpm_ea3a1a_17fbb1` (`ewm_i_d`,`sb_i_d`,`xjzt`,`gxsj`,`cjsj`,`bz`) VALUES ('EWM-20240801002','SB-2024002','已完成','2024-08-01 09:15:00','2024-08-01 08:45:00','振动值略高，建议下周重点关注');
INSERT INTO `crpm_ea3a1a_17fbb1` (`ewm_i_d`,`sb_i_d`,`xjzt`,`gxsj`,`cjsj`,`bz`) VALUES ('EWM-20240801003','SB-2024003','已完成','2024-08-01 10:00:00','2024-08-01 09:30:00','冷却系统需要清洗');
INSERT INTO `crpm_ea3a1a_17fbb1` (`ewm_i_d`,`sb_i_d`,`xjzt`,`gxsj`,`cjsj`,`bz`) VALUES ('EWM-20240801004','SB-2024004','已完成','2024-08-01 10:45:00','2024-08-01 10:15:00','传送带张紧度正常');
INSERT INTO `crpm_ea3a1a_17fbb1` (`ewm_i_d`,`sb_i_d`,`xjzt`,`gxsj`,`cjsj`,`bz`) VALUES ('EWM-20240801005','SB-2024005','已完成','2024-08-01 11:30:00','2024-08-01 11:00:00','电机温度正常，无杂音');
INSERT INTO `crpm_ea3a1a_17fbb1` (`ewm_i_d`,`sb_i_d`,`xjzt`,`gxsj`,`cjsj`,`bz`) VALUES ('EWM-20240802001','SB-2024006','已完成','2024-08-02 08:30:00','2024-08-02 08:00:00','润滑系统正常');
INSERT INTO `crpm_ea3a1a_17fbb1` (`ewm_i_d`,`sb_i_d`,`xjzt`,`gxsj`,`cjsj`,`bz`) VALUES ('EWM-20240802002','SB-2024007','已完成','2024-08-02 09:15:00','2024-08-02 08:45:00','传感器读数稳定');
INSERT INTO `crpm_ea3a1a_17fbb1` (`ewm_i_d`,`sb_i_d`,`xjzt`,`gxsj`,`cjsj`,`bz`) VALUES ('EWM-20240802003','SB-2024008','已完成','2024-08-02 10:00:00','2024-08-02 09:30:00','刀具磨损度正常');
INSERT INTO `crpm_ea3a1a_17fbb1` (`ewm_i_d`,`sb_i_d`,`xjzt`,`gxsj`,`cjsj`,`bz`) VALUES ('EWM-20240802004','SB-2024009','已完成','2024-08-02 10:45:00','2024-08-02 10:15:00','控制系统运行稳定');
INSERT INTO `crpm_ea3a1a_17fbb1` (`ewm_i_d`,`sb_i_d`,`xjzt`,`gxsj`,`cjsj`,`bz`) VALUES ('EWM-20240802005','SB-2024010','已完成','2024-08-02 11:30:00','2024-08-02 11:00:00','气压系统正常，无泄漏');
INSERT INTO `crpm_ea3a1a_17fbb1` (`ewm_i_d`,`sb_i_d`,`xjzt`,`gxsj`,`cjsj`,`bz`) VALUES ('EWM-20240803001','SB-2024011','已完成','2024-08-03 08:30:00','2024-08-03 08:00:00','风机运行平稳');
INSERT INTO `crpm_ea3a1a_17fbb1` (`ewm_i_d`,`sb_i_d`,`xjzt`,`gxsj`,`cjsj`,`bz`) VALUES ('EWM-20240803002','SB-2024012','已完成','2024-08-03 09:15:00','2024-08-03 08:45:00','液压系统压力正常');
INSERT INTO `crpm_ea3a1a_17fbb1` (`ewm_i_d`,`sb_i_d`,`xjzt`,`gxsj`,`cjsj`,`bz`) VALUES ('EWM-20240803003','SB-2024013','已完成','2024-08-03 10:00:00','2024-08-03 09:30:00','链条张紧度正常');
INSERT INTO `crpm_ea3a1a_17fbb1` (`ewm_i_d`,`sb_i_d`,`xjzt`,`gxsj`,`cjsj`,`bz`) VALUES ('EWM-20240803004','SB-2024014','已完成','2024-08-03 10:45:00','2024-08-03 10:15:00','联轴器无松动');
INSERT INTO `crpm_ea3a1a_17fbb1` (`ewm_i_d`,`sb_i_d`,`xjzt`,`gxsj`,`cjsj`,`bz`) VALUES ('EWM-20240803005','SB-2024015','已完成','2024-08-03 11:30:00','2024-08-03 11:00:00','温控系统正常');
INSERT INTO `crpm_ea3a1a_17fbb1` (`ewm_i_d`,`sb_i_d`,`xjzt`,`gxsj`,`cjsj`,`bz`) VALUES ('EWM-20240901001','SB-2024001','已完成','2024-09-01 08:30:00','2024-09-01 08:00:00','更换滤芯，运行正常');
INSERT INTO `crpm_ea3a1a_17fbb1` (`ewm_i_d`,`sb_i_d`,`xjzt`,`gxsj`,`cjsj`,`bz`) VALUES ('EWM-20240901002','SB-2024003','已完成','2024-09-01 09:15:00','2024-09-01 08:45:00','清洗冷却系统，压力稳定');
INSERT INTO `crpm_ea3a1a_17fbb1` (`ewm_i_d`,`sb_i_d`,`xjzt`,`gxsj`,`cjsj`,`bz`) VALUES ('EWM-20240901003','SB-2024005','已完成','2024-09-01 10:00:00','2024-09-01 09:30:00','轴承润滑良好');
INSERT INTO `crpm_ea3a1a_17fbb1` (`ewm_i_d`,`sb_i_d`,`xjzt`,`gxsj`,`cjsj`,`bz`) VALUES ('EWM-20240901004','SB-2024007','已完成','2024-09-01 10:45:00','2024-09-01 10:15:00','校准传感器，读数准确');
INSERT INTO `crpm_ea3a1a_17fbb1` (`ewm_i_d`,`sb_i_d`,`xjzt`,`gxsj`,`cjsj`,`bz`) VALUES ('EWM-20240901005','SB-2024009','已完成','2024-09-01 11:30:00','2024-09-01 11:00:00','更新控制系统程序');